Summary Page Created:Tue April 11, 2006 12:24 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290393

Instrument: HRC Obs ID: 5120 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05120N002 full img2.fits hrcf05120N002 cntr img2.fits

Summary Page Created:Tue April 11, 2006 12:24 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290393

Instrument: HRC Obs ID: 5120 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-11T16:10:44 Date and time of file creation DATE-OBS 2004-11-28T12:54:47 Observation start date DATE-END 2004-11-28T13:18:16 Observation end date RA PNT 332.14677494572 Pointing RA DEC PNT 45.906780456808 Pointing Dec ROLL PNT 287.0816464442 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-11T16:23:10 Date and time of file creation DATE-OBS 2004-11-28T12:54:47 Observation start date DATE-END 2004-11-28T13:18:16 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5120 Observation id SEQ NUM 290393 Sequence number RA NOM 332.14677494572 Nominal RA DEC NOM 45.906780456808 Nominal Dec ROLL NOM 287.0816464442 Nominal Roll

Summary Page Created:Tue April 11, 2006 12:24 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290393

Instrument: HRC Obs ID: 5120 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170114 45.742464 2668.762451 59.225899 45.060734 332.169977 45.741952 2329.351807 58.688881 39.689831 332.088793 46.209035 100.234825 21.262747 4.714105 331.962668 46.188338 95.539284 21.672689 4.408280 332.213583 45.713486 43.916668 13.748982 3.194176 332.100813 46.175056 65.199997 20.426813 3.191883 332.191435 45.662061 53.333332 16.991899 3.138751 332.019845 46.044173 30.257500 9.893913 3.058193 331.972133 46.149312 63.945454 21.087551 3.032379