Summary Page Created:Tue April 11, 2006 12:27 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290394

Instrument: HRC Obs ID: 5121 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05121N002 full img2.fits hrcf05121N002 cntr img2.fits

Summary Page Created:Tue April 11, 2006 12:27 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290394

Instrument: HRC Obs ID: 5121 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-11T16:12:09 Date and time of file creation DATE-OBS 2004-11-28T13:18:16 Observation start date DATE-END 2004-11-28T13:41:46 Observation end date RA PNT 332.05436130799 Pointing RA DEC PNT 45.887061798636 Pointing Dec ROLL PNT 287.16211049623 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-11T16:25:32 Date and time of file creation DATE-OBS 2004-11-28T13:18:16 Observation start date DATE-END 2004-11-28T13:41:46 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5121 Observation id SEQ NUM 290394 Sequence number RA NOM 332.05436130799 Nominal RA DEC NOM 45.887061798636 Nominal Dec ROLL NOM 287.16211049623 Nominal Roll

Summary Page Created:Tue April 11, 2006 12:27 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290394

Instrument: HRC Obs ID: 5121 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.170615 45.742382 1648.372437 46.471134 35.470890 332.127746 45.734223 96.387497 15.660334 6.154881 332.100964 45.727616 80.105003 14.469203 5.536242 332.156220 45.739389 68.207497 13.919037 4.900303 331.868523 46.158316 91.511604 21.526079 4.251197 331.933095 46.182034 79.096428 20.476879 3.862719 332.156904 45.738563 53.386208 14.265971 3.742206 332.011573 46.151204 62.888195 17.495188 3.594600 331.885727 46.112451 59.689655 17.497965 3.411234 331.988681 46.195194 58.570538 18.923126 3.095183