Summary Page Created:Tue April 11, 2006 12:32 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290395

Instrument: HRC Obs ID: 5122 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

hrcf05122N002 full img2.fits hrcf05122N002 cntr img2.fits

Summary Page Created:Tue April 11, 2006 12:32 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290395

Instrument: HRC Obs ID: 5122 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-11T16:17:20 Date and time of file creation DATE-OBS 2004-11-28T13:41:46 Observation start date DATE-END 2004-11-28T14:13:21 Observation end date RA PNT 332.1956169087 Pointing RA DEC PNT 45.568568633469 Pointing Dec ROLL PNT 287.15432437631 Pointing Roll RA TARG 332.17 Observer’s specified target RA DEC TARG 45.742306 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-11T16:30:58 Date and time of file creation DATE-OBS 2004-11-28T13:41:46 Observation start date DATE-END 2004-11-28T14:13:21 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT ArLac Source name TITLE AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5122 Observation id SEQ NUM 290395 Sequence number RA NOM 332.1956169087 Nominal RA DEC NOM 45.568568633469 Nominal Dec ROLL NOM 287.15432437631 Nominal Roll

Summary Page Created:Tue April 11, 2006 12:32 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290395

Instrument: HRC Obs ID: 5122 Source: ArLac PI: Dr. CXC Calibration Title: AO5B Calibration Observations to Monitor the Spatial Variations in the HRC-S Gain

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 332.169717 45.742481 3339.172363 64.203369 52.009304 332.169713 45.742959 2401.943115 63.497494 37.827370 332.157357 45.524466 45.958332 8.271943 5.555930 332.011776 45.839786 114.172325 24.697004 4.622922 332.074983 45.858611 103.445534 26.306341 3.932342 332.137079 45.875192 68.933929 17.928764 3.844879 332.198543 45.723149 39.360001 10.270018 3.832515 332.144010 45.855108 83.041664 22.406961 3.706065 332.038257 45.851569 89.172325 24.156626 3.691423 332.072542 45.691547 29.715910 8.160802 3.641298