Summary Page Created:Wed April 12, 2006 01:47 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290444

Instrument: HRC Obs ID: 5347 Source: Vega PI: Dr. CXC Calibration Title: Monitoring the health of the HRC UV Ion shield

hrcf05347N002 full img2.fits hrcf05347N002 cntr img2.fits

Summary Page Created:Wed April 12, 2006 01:47 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290444

Instrument: HRC Obs ID: 5347 Source: Vega PI: Dr. CXC Calibration Title: Monitoring the health of the HRC UV Ion shield

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-12T05:09:41 Date and time of file creation DATE-OBS 2004-11-07T03:42:38 Observation start date DATE-END 2004-11-07T04:41:08 Observation end date RA PNT 279.23836415252 Pointing RA DEC PNT 38.780057301192 Pointing Dec ROLL PNT 304.51521436588 Pointing Roll RA TARG 279.235 Observer’s specified target RA DEC TARG 38.783778 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 Processing system revision DATE 2006-04-12T05:46:12 Date and time of file creation DATE-OBS 2004-11-07T03:42:38 Observation start date DATE-END 2004-11-07T04:41:08 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT Vega Source name TITLE Monitoring the health of the HRC UV Ion shield

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5347 Observation id SEQ NUM 290444 Sequence number RA NOM 279.23836415252 Nominal RA DEC NOM 38.780057301192 Nominal Dec ROLL NOM 304.51521436588 Nominal Roll

Summary Page Created:Wed April 12, 2006 01:47 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290444

Instrument: HRC Obs ID: 5347 Source: Vega PI: Dr. CXC Calibration Title: Monitoring the health of the HRC UV Ion shield

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 279.235088 38.784076 228.375000 21.751823 10.499120 278.974159 38.999664 238.306244 37.449306 6.363435 279.071121 39.055889 205.368744 35.051598 5.859041 279.014844 39.030390 214.105362 38.817822 5.515646 279.472363 38.612621 86.875000 20.140272 4.313497 279.039344 39.043415 159.188400 38.156559 4.171980 279.371929 38.553585 86.125000 23.565023 3.654781 279.329740 38.710343 28.636364 7.946523 3.603634 279.093348 39.036883 111.875000 31.196543 3.586135 279.188721 38.894974 41.102272 11.899300 3.454176