Summary Page Created:Fri August 4, 2006 00:17 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 290446

Instrument: HRC Obs ID: 5349 Source: Vega PI: Dr. CXC Calibration Title: Monitoring the health of the HRC UV Ion shield

hrcf05349N003 full img2.fits hrcf05349N003 cntr img2.fits

Summary Page Created:Fri August 4, 2006 00:17 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 290446

Instrument: HRC Obs ID: 5349 Source: Vega PI: Dr. CXC Calibration Title: Monitoring the health of the HRC UV Ion shield

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-04T03:18:16 Date and time of file creation DATE-OBS 2004-11-07T05:39:38 Observation start date DATE-END 2004-11-07T06:47:05 Observation end date RA PNT 279.47932003218 Pointing RA DEC PNT 38.504652503014 Pointing Dec ROLL PNT 304.36194207064 Pointing Roll RA TARG 279.235 Observer’s specified target RA DEC TARG 38.783778 Observer’s specified target Dec DEGAP hrcsD1999-07- 22gaplookupN0002.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8.1 Processing system revision DATE 2006-08-04T04:11:59 Date and time of file creation DATE-OBS 2004-11-07T05:39:38 Observation start date DATE-END 2004-11-07T06:47:05 Observation end date INSTRUME HRC Instrument DETNAM HRC-S Detector GRATING NONE Grating OBJECT Vega Source name TITLE Monitoring the health of the HRC UV Ion shield

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5349 Observation id SEQ NUM 290446 Sequence number RA NOM 279.47932003218 Nominal RA DEC NOM 38.504652503014 Nominal Dec ROLL NOM 304.36194207064 Nominal Roll

Summary Page Created:Fri August 4, 2006 00:17 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 290446

Instrument: HRC Obs ID: 5349 Source: Vega PI: Dr. CXC Calibration Title: Monitoring the health of the HRC UV Ion shield

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 279.232254 38.782740 364859.093750 659.030945 553.629700 279.236823 38.782897 53469.554688 615.031494 86.937912