Summary Page Created:Fri June 23, 2006 13:05 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590321

Instrument: ACIS Obs ID: 5123 Source: E0102-72[S3,-120,1,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

acisf05123N002 full img2.fits acisf05123N002 cntr img2.fits

Summary Page Created:Fri June 23, 2006 13:05 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590321

Instrument: ACIS Obs ID: 5123 Source: E0102-72[S3,-120,1,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-23T16:44:15 Date and time of file creation DATE-OBS 2003-12-15T04:27:06 Observation start date DATE-END 2003-12-15T10:33:02 Observation end date RA PNT 15.985074142683 Pointing RA DEC PNT -72.021849584075 Pointing Dec ROLL PNT 299.6994128382 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-23T17:03:33 Date and time of file creation DATE-OBS 2003-12-15T04:27:06 Observation start date DATE-END 2003-12-15T10:33:02 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S3,-120,1,0,0] Source name TITLE AO5A ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5123 Observation id SEQ NUM 590321 Sequence number RA NOM 15.985074142683 Nominal RA DEC NOM -72.021849584075 Nominal Dec ROLL NOM 299.6994128382 Nominal Roll

Summary Page Created:Fri June 23, 2006 13:05 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590321

Instrument: ACIS Obs ID: 5123 Source: E0102-72[S3,-120,1,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.906371 -72.025911 585.714294 25.932680 22.585953 16.015956 -72.034694 1045.285767 72.707497 14.376588 16.018850 -72.032779 934.428589 75.415649 12.390381 15.999278 -72.028412 848.428589 68.669380 12.355268 16.017966 -72.033628 934.285706 75.772408 12.330157 16.008915 -72.031995 587.714294 51.035763 11.515735 16.020389 -72.031432 729.000000 64.377487 11.323834 16.002047 -72.034898 775.714294 68.567657 11.313122 16.003605 -72.028114 670.428589 66.387184 10.098764 16.309185 -72.315477 448.478394 44.690830 10.035132