Summary Page Created:Fri June 23, 2006 13:09 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590322

Instrument: ACIS Obs ID: 5124 Source: E0102-72[S3,-120,-1,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

acisf05124N002 full img2.fits acisf05124N002 cntr img2.fits

Summary Page Created:Fri June 23, 2006 13:09 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590322

Instrument: ACIS Obs ID: 5124 Source: E0102-72[S3,-120,-1,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-23T16:52:38 Date and time of file creation DATE-OBS 2003-12-15T10:33:02 Observation start date DATE-END 2003-12-15T12:59:02 Observation end date RA PNT 16.038174217547 Pointing RA DEC PNT -72.050917019385 Pointing Dec ROLL PNT 299.48970394551 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-23T17:08:24 Date and time of file creation DATE-OBS 2003-12-15T10:33:02 Observation start date DATE-END 2003-12-15T12:59:02 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S3,-120,-1,0,0] Source name TITLE AO5A ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5124 Observation id SEQ NUM 590322 Sequence number RA NOM 16.038174217547 Nominal RA DEC NOM -72.050917019385 Nominal Dec ROLL NOM 299.48970394551 Nominal Roll

Summary Page Created:Fri June 23, 2006 13:09 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590322

Instrument: ACIS Obs ID: 5124 Source: E0102-72[S3,-120,-1,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.003584 -72.034768 524.714294 49.114307 10.683532 15.906322 -72.025873 131.238632 12.894653 10.177756 16.015892 -72.034772 433.000000 45.842709 9.445340 16.020361 -72.031260 325.571442 41.309757 7.881223 15.998498 -72.028278 307.857147 39.721916 7.750310 16.017008 -72.033976 343.714294 44.622936 7.702637 16.018700 -72.033154 367.142853 47.723198 7.693174 15.996593 -72.031235 325.571442 43.086079 7.556302 16.289989 -72.197027 91.082756 12.071694 7.545151 16.008808 -72.032046 217.000000 30.866150 7.030355