Summary Page Created:Fri June 23, 2006 13:28 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590323

Instrument: ACIS Obs ID: 5125 Source: E0102-72[S1,-120,13.29,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

acisf05125N002 full img2.fits acisf05125N002 cntr img2.fits

Summary Page Created:Fri June 23, 2006 13:28 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590323

Instrument: ACIS Obs ID: 5125 Source: E0102-72[S1,-120,13.29,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-23T17:05:39 Date and time of file creation DATE-OBS 2003-12-15T12:59:02 Observation start date DATE-END 2003-12-15T15:25:02 Observation end date RA PNT 15.664017708251 Pointing RA DEC PNT -71.842751741173 Pointing Dec ROLL PNT 299.10092668939 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-23T17:27:29 Date and time of file creation DATE-OBS 2003-12-15T12:59:02 Observation start date DATE-END 2003-12-15T15:25:02 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S1,-120,13.29,0,0] Source name TITLE AO5A ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5125 Observation id SEQ NUM 590323 Sequence number RA NOM 15.664017708251 Nominal RA DEC NOM -71.842751741173 Nominal Dec ROLL NOM 299.10092668939 Nominal Roll

Summary Page Created:Fri June 23, 2006 13:28 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590323

Instrument: ACIS Obs ID: 5125 Source: E0102-72[S1,-120,13.29,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.008301 -72.030874 21776.353516 203.773575 106.865448 15.906581 -72.025956 155.985718 22.197861 7.027061 15.966970 -72.136326 136.813950 27.350172 5.002307 16.301481 -72.077293 133.159470 30.308565 4.393460 15.526095 -71.687825 39.062069 8.970821 4.354347 15.915775 -72.110163 110.541664 25.826462 4.280170 15.706649 -71.966435 26.875000 7.224754 3.719850 15.755662 -72.031351 43.708332 11.959747 3.654620 15.723464 -71.805023 25.428572 7.221868 3.521052 16.131083 -72.109841 108.026581 31.441784 3.435765