Summary Page Created:Fri June 23, 2006 13:21 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590324

Instrument: ACIS Obs ID: 5126 Source: E0102-72[S0,-120,21.44,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

acisf05126N002 full img2.fits acisf05126N002 cntr img2.fits

Summary Page Created:Fri June 23, 2006 13:21 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590324

Instrument: ACIS Obs ID: 5126 Source: E0102-72[S0,-120,21.44,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-23T17:06:16 Date and time of file creation DATE-OBS 2003-12-15T15:25:02 Observation start date DATE-END 2003-12-15T17:51:02 Observation end date RA PNT 15.455382555346 Pointing RA DEC PNT -71.723607825018 Pointing Dec ROLL PNT 298.84218135993 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-23T17:20:38 Date and time of file creation DATE-OBS 2003-12-15T15:25:02 Observation start date DATE-END 2003-12-15T17:51:02 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S0,-120,21.44,0,0] Source name TITLE AO5A ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5126 Observation id SEQ NUM 590324 Sequence number RA NOM 15.455382555346 Nominal RA DEC NOM -71.723607825018 Nominal Dec ROLL NOM 298.84218135993 Nominal Roll

Summary Page Created:Fri June 23, 2006 13:21 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590324

Instrument: ACIS Obs ID: 5126 Source: E0102-72[S0,-120,21.44,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.527853 -71.687794 71.714287 10.042165 7.141317 16.106479 -71.962731 113.767441 22.523300 5.051100 15.714345 -71.998385 112.947319 25.797899 4.378160 15.755285 -72.017506 112.425247 26.522785 4.238818 15.115830 -71.527137 42.728722 11.032840 3.872867 15.080399 -71.571553 25.708334 7.867955 3.267473 16.005025 -71.971659 100.867111 30.907759 3.263488 15.412553 -71.818459 19.897499 6.215782 3.201126 16.003992 -71.902413 64.041382 20.494091 3.124870 15.693348 -71.900783 47.166668 15.336946 3.075362