Summary Page Created:Fri June 23, 2006 14:51 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590325

Instrument: ACIS Obs ID: 5127 Source: E0102-72[S2,-120,5.15,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

acisf05127N002 full img2.fits acisf05127N002 cntr img2.fits

Summary Page Created:Fri June 23, 2006 14:51 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590325

Instrument: ACIS Obs ID: 5127 Source: E0102-72[S2,-120,5.15,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-23T18:33:59 Date and time of file creation DATE-OBS 2003-12-15T17:51:02 Observation start date DATE-END 2003-12-15T20:17:02 Observation end date RA PNT 15.877117328615 Pointing RA DEC PNT -71.96130335404 Pointing Dec ROLL PNT 299.07096762082 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-23T18:49:49 Date and time of file creation DATE-OBS 2003-12-15T17:51:02 Observation start date DATE-END 2003-12-15T20:17:02 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S2,-120,5.15,0,0] Source name TITLE AO5A ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5127 Observation id SEQ NUM 590325 Sequence number RA NOM 15.877117328615 Nominal RA DEC NOM -71.96130335404 Nominal Dec ROLL NOM 299.07096762082 Nominal Roll

Summary Page Created:Fri June 23, 2006 14:51 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590325

Instrument: ACIS Obs ID: 5127 Source: E0102-72[S2,-120,5.15,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.018930 -72.032997 992.125000 59.176498 16.765524 16.015333 -72.034844 787.886353 58.391743 13.493113 16.000872 -72.028209 683.333313 55.410828 12.332127 15.996782 -72.030928 641.875000 54.767704 11.719954 16.003360 -72.034858 663.416687 59.744625 11.104206 15.906289 -72.025868 148.142853 13.882462 10.671225 16.011591 -72.026876 411.583344 49.101154 8.382356 16.007485 -72.027439 446.458344 53.605778 8.328548 15.998960 -72.033633 407.750000 58.714993 6.944563 16.182380 -72.255340 165.245850 25.306639 6.529743