Summary Page Created:Fri June 23, 2006 15:34 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590326

Instrument: ACIS Obs ID: 5128 Source: E0102-72[S4,-120,-9.15,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

acisf05128N002 full img2.fits acisf05128N002 cntr img2.fits

Summary Page Created:Fri June 23, 2006 15:34 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590326

Instrument: ACIS Obs ID: 5128 Source: E0102-72[S4,-120,-9.15,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-23T18:44:45 Date and time of file creation DATE-OBS 2003-12-15T20:17:02 Observation start date DATE-END 2003-12-15T22:43:02 Observation end date RA PNT 16.252216395159 Pointing RA DEC PNT -72.16977801371 Pointing Dec ROLL PNT 299.26460041097 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-23T19:33:14 Date and time of file creation DATE-OBS 2003-12-15T20:17:02 Observation start date DATE-END 2003-12-15T22:43:02 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S4,-120,-9.15,0,0] Source name TITLE AO5A ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5128 Observation id SEQ NUM 590326 Sequence number RA NOM 16.252216395159 Nominal RA DEC NOM -72.16977801371 Nominal Dec ROLL NOM 299.26460041097 Nominal Roll

Summary Page Created:Fri June 23, 2006 15:34 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590326

Instrument: ACIS Obs ID: 5128 Source: E0102-72[S4,-120,-9.15,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.003749 -72.033653 3284.137451 115.021439 28.552395 16.004608 -72.028178 2680.199951 107.932899 24.832094 16.015321 -72.033578 2515.344971 107.698524 23.355427 15.907765 -72.026116 149.386368 15.547047 9.608665 16.401666 -72.163449 49.159092 8.551292 5.748733 16.387340 -72.225438 42.142857 8.699374 4.844355 16.559667 -72.457839 138.910294 28.981310 4.793099 16.290315 -72.196376 34.000000 7.300402 4.657278 16.920089 -72.404766 96.697678 22.862705 4.229494 16.249030 -72.196729 27.000000 6.711311 4.023059