Summary Page Created:Fri June 23, 2006 15:50 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590327

Instrument: ACIS Obs ID: 5129 Source: E0102-72[S5,-120,-17.29,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

acisf05129N002 full img2.fits acisf05129N002 cntr img2.fits

Summary Page Created:Fri June 23, 2006 15:50 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590327

Instrument: ACIS Obs ID: 5129 Source: E0102-72[S5,-120,-17.29,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-23T19:06:00 Date and time of file creation DATE-OBS 2003-12-15T22:43:02 Observation start date DATE-END 2003-12-16T01:09:02 Observation end date RA PNT 16.466907743178 Pointing RA DEC PNT -72.288441566951 Pointing Dec ROLL PNT 299.33370601177 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-23T19:48:40 Date and time of file creation DATE-OBS 2003-12-15T22:43:02 Observation start date DATE-END 2003-12-16T01:09:02 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S5,-120,-17.29,0,0] Source name TITLE AO5A ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5129 Observation id SEQ NUM 590327 Sequence number RA NOM 16.466907743178 Nominal RA DEC NOM -72.288441566951 Nominal Dec ROLL NOM 299.33370601177 Nominal Roll

Summary Page Created:Fri June 23, 2006 15:50 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590327

Instrument: ACIS Obs ID: 5129 Source: E0102-72[S5,-120,-17.29,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.012138 -72.030878 13011.703125 140.222366 92.793350 16.290396 -72.196342 95.103447 12.535768 7.586567 16.387246 -72.225301 80.857140 11.094528 7.288020 16.737652 -72.413767 79.565002 12.033333 6.612051 15.995521 -72.030180 843.229248 129.184494 6.527326 15.897854 -72.025834 120.817276 19.674814 6.140707 16.779097 -72.582435 149.501663 27.204290 5.495518 17.137242 -72.523359 140.036545 26.712559 5.242349 16.401464 -72.163630 40.791668 8.599583 4.743447 16.658532 -72.521052 87.958336 20.054834 4.385892