Summary Page Created:Thu May 25, 2006 05:00 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590328

Instrument: ACIS Obs ID: 5130 Source: E0102-72[S3,-120,1,0,0] PI: Dr. CXC Calibration Title: AO5B ACIS-S Calibration Observations of E0102-72

acisf05130N002 full img2.fits acisf05130N002 cntr img2.fits

Summary Page Created:Thu May 25, 2006 05:00 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590328

Instrument: ACIS Obs ID: 5130 Source: E0102-72[S3,-120,1,0,0] PI: Dr. CXC Calibration Title: AO5B ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-25T08:11:13 Date and time of file creation DATE-OBS 2004-04-09T13:08:57 Observation start date DATE-END 2004-04-09T18:56:51 Observation end date RA PNT 16.051298569152 Pointing RA DEC PNT -72.030897640181 Pointing Dec ROLL PNT 177.78564137599 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-25T08:59:14 Date and time of file creation DATE-OBS 2004-04-09T13:08:57 Observation start date DATE-END 2004-04-09T18:56:51 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S3,-120,1,0,0] Source name TITLE AO5B ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5130 Observation id SEQ NUM 590328 Sequence number RA NOM 16.051298569152 Nominal RA DEC NOM -72.030897640181 Nominal Dec ROLL NOM 177.78564137599 Nominal Roll

Summary Page Created:Thu May 25, 2006 05:00 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590328

Instrument: ACIS Obs ID: 5130 Source: E0102-72[S3,-120,1,0,0] PI: Dr. CXC Calibration Title: AO5B ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.906456 -72.025892 801.034119 29.842630 26.841940 16.015829 -72.034717 994.428589 70.346924 14.136063 16.017594 -72.033885 962.000000 71.261169 13.499639 15.999133 -72.028405 849.142883 66.353989 12.797163 16.002671 -72.034724 909.000000 72.931007 12.463835 16.008811 -72.032021 596.571411 48.247013 12.364940 15.404216 -72.072130 446.192688 37.363571 11.941918 16.013194 -72.035257 710.428589 63.782146 11.138361 16.020197 -72.031722 741.428589 67.088371 11.051522 16.018671 -72.033085 747.857117 73.041771 10.238760