Summary Page Created:Sat May 27, 2006 07:30 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590329

Instrument: ACIS Obs ID: 5131 Source: E0102-72[S3,-120,-1,0,0] PI: Dr. CXC Calibration Title: AO5B ACIS-S Calibration Observations of E0102-72

acisf05131N002 full img2.fits acisf05131N002 cntr img2.fits

Summary Page Created:Sat May 27, 2006 07:30 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590329

Instrument: ACIS Obs ID: 5131 Source: E0102-72[S3,-120,-1,0,0] PI: Dr. CXC Calibration Title: AO5B ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-27T11:05:28 Date and time of file creation DATE-OBS 2004-04-05T04:49:32 Observation start date DATE-END 2004-04-05T07:33:16 Observation end date RA PNT 15.942792367509 Pointing RA DEC PNT -72.030913028134 Pointing Dec ROLL PNT 181.6552224045 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-27T11:30:05 Date and time of file creation DATE-OBS 2004-04-05T04:49:32 Observation start date DATE-END 2004-04-05T07:33:16 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S3,-120,-1,0,0] Source name TITLE AO5B ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5131 Observation id SEQ NUM 590329 Sequence number RA NOM 15.942792367509 Nominal RA DEC NOM -72.030913028134 Nominal Dec ROLL NOM 181.6552224045 Nominal Roll

Summary Page Created:Sat May 27, 2006 07:30 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590329

Instrument: ACIS Obs ID: 5131 Source: E0102-72[S3,-120,-1,0,0] PI: Dr. CXC Calibration Title: AO5B ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.405748 -72.071901 223.303452 18.968197 11.772519 16.015505 -72.034730 467.142853 47.684990 9.796433 16.002327 -72.034746 410.000000 45.112526 9.088385 16.017277 -72.033908 420.571442 46.790615 8.988371 16.009033 -72.032013 270.142853 31.898296 8.468881 15.906450 -72.025861 97.428574 11.554498 8.432091 16.012854 -72.035262 324.714294 42.179058 7.698472 16.019145 -72.032294 340.714294 45.536171 7.482278 15.998693 -72.028414 305.571442 41.318913 7.395437 16.019048 -72.032811 336.142853 48.278439 6.962588