Summary Page Created:Thu May 25, 2006 04:32 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590330

Instrument: ACIS Obs ID: 5132 Source: E0102-72[S1,-120,13.29,0,0] PI: Dr. CXC Calibration Title: AO5B ACIS-S Calibration Observations of E0102-72

acisf05132N002 full img2.fits acisf05132N002 cntr img2.fits

Summary Page Created:Thu May 25, 2006 04:32 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590330

Instrument: ACIS Obs ID: 5132 Source: E0102-72[S1,-120,13.29,0,0] PI: Dr. CXC Calibration Title: AO5B ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-25T07:58:08 Date and time of file creation DATE-OBS 2004-04-09T18:56:51 Observation start date DATE-END 2004-04-09T21:16:01 Observation end date RA PNT 16.714833694326 Pointing RA DEC PNT -72.039072317914 Pointing Dec ROLL PNT 178.21103703971 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-25T08:31:23 Date and time of file creation DATE-OBS 2004-04-09T18:56:51 Observation start date DATE-END 2004-04-09T21:16:01 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S1,-120,13.29,0,0] Source name TITLE AO5B ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5132 Observation id SEQ NUM 590330 Sequence number RA NOM 16.714833694326 Nominal RA DEC NOM -72.039072317914 Nominal Dec ROLL NOM 178.21103703971 Nominal Roll

Summary Page Created:Thu May 25, 2006 04:32 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590330

Instrument: ACIS Obs ID: 5132 Source: E0102-72[S1,-120,13.29,0,0] PI: Dr. CXC Calibration Title: AO5B ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.010679 -72.031045 18982.757812 194.251587 97.722534 15.906140 -72.024789 240.779312 28.831917 8.351138 15.740752 -71.965349 177.189362 27.346743 6.479359 15.740054 -71.997159 147.598007 28.771660 5.129979 15.734244 -72.088504 118.584717 27.128746 4.371183 17.352860 -72.107009 52.013290 11.994182 4.336544 15.811058 -72.090711 98.583336 24.452669 4.031598 15.848712 -71.966428 100.875000 25.273844 3.991281 17.338491 -72.107809 39.853821 10.070786 3.957370 15.843633 -72.090814 101.125000 26.069555 3.879046