Summary Page Created:Thu May 25, 2006 04:51 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590331

Instrument: ACIS Obs ID: 5133 Source: E0102-72[S0,-120,21.44,0,0] PI: Dr. CXC Calibration Title: AO5B ACIS-S Calibration Observations of E0102-72

acisf05133N002 full img2.fits acisf05133N002 cntr img2.fits

Summary Page Created:Thu May 25, 2006 04:51 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590331

Instrument: ACIS Obs ID: 5133 Source: E0102-72[S0,-120,21.44,0,0] PI: Dr. CXC Calibration Title: AO5B ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-25T08:10:21 Date and time of file creation DATE-OBS 2004-04-09T21:16:01 Observation start date DATE-END 2004-04-09T23:35:11 Observation end date RA PNT 17.155137430657 Pointing RA DEC PNT -72.043559782411 Pointing Dec ROLL PNT 178.56026721169 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-25T08:51:06 Date and time of file creation DATE-OBS 2004-04-09T21:16:01 Observation start date DATE-END 2004-04-09T23:35:11 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S0,-120,21.44,0,0] Source name TITLE AO5B ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5133 Observation id SEQ NUM 590331 Sequence number RA NOM 17.155137430657 Nominal RA DEC NOM -72.043559782411 Nominal Dec ROLL NOM 178.56026721169 Nominal Roll

Summary Page Created:Thu May 25, 2006 04:51 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590331

Instrument: ACIS Obs ID: 5133 Source: E0102-72[S0,-120,21.44,0,0] PI: Dr. CXC Calibration Title: AO5B ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 17.393432 -72.060679 65.875000 9.839198 6.695159 16.236552 -72.094552 166.528564 27.646700 6.023452 16.180887 -71.975757 166.750824 29.037146 5.742673 16.175070 -72.053934 140.541534 30.242008 4.647229 16.576650 -72.100138 81.416664 17.730993 4.591771 16.173331 -72.093210 131.139542 28.717609 4.566520 16.266587 -72.095608 122.666664 26.963863 4.549299 17.780988 -72.051211 60.162498 13.290926 4.526585 17.092914 -72.063911 31.000000 7.055173 4.393939 16.523098 -71.991098 63.352680 16.477303 3.844845