Summary Page Created:Thu May 25, 2006 04:40 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590332

Instrument: ACIS Obs ID: 5134 Source: E0102-72[S2,-120,5.15,0,0] PI: Dr. CXC Calibration Title: AO5B ACIS-S Calibration Observations of E0102-72

acisf05134N002 full img2.fits acisf05134N002 cntr img2.fits

Summary Page Created:Thu May 25, 2006 04:40 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590332

Instrument: ACIS Obs ID: 5134 Source: E0102-72[S2,-120,5.15,0,0] PI: Dr. CXC Calibration Title: AO5B ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-25T08:03:46 Date and time of file creation DATE-OBS 2004-04-09T23:35:11 Observation start date DATE-END 2004-04-10T02:05:08 Observation end date RA PNT 16.275202874729 Pointing RA DEC PNT -72.034169358945 Pointing Dec ROLL PNT 177.58162259925 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-25T08:39:14 Date and time of file creation DATE-OBS 2004-04-09T23:35:11 Observation start date DATE-END 2004-04-10T02:05:08 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S2,-120,5.15,0,0] Source name TITLE AO5B ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5134 Observation id SEQ NUM 590332 Sequence number RA NOM 16.275202874729 Nominal RA DEC NOM -72.034169358945 Nominal Dec ROLL NOM 177.58162259925 Nominal Roll

Summary Page Created:Thu May 25, 2006 04:40 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590332

Instrument: ACIS Obs ID: 5134 Source: E0102-72[S2,-120,5.15,0,0] PI: Dr. CXC Calibration Title: AO5B ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.999450 -72.028332 798.363647 55.788147 14.310632 15.906234 -72.025861 287.241394 20.192059 14.225463 16.018318 -72.033250 719.333313 54.312508 13.244340 15.996739 -72.030774 717.693176 57.538521 12.473265 16.002655 -72.034542 705.375000 59.683884 11.818517 15.999307 -72.033937 687.636353 61.843388 11.118996 16.009105 -72.027098 551.125000 53.790482 10.245771 16.013516 -72.035142 513.541687 50.177921 10.234415 16.017975 -72.028485 334.125000 47.987415 6.962763 16.020300 -72.029785 283.041656 46.360275 6.105263