Summary Page Created:Thu May 25, 2006 05:00 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590333

Instrument: ACIS Obs ID: 5135 Source: E0102-72[S4,-120,-9.15,0,0] PI: Dr. CXC Calibration Title: AO5B ACIS-S Calibration Observations of E0102-72

acisf05135N002 full img2.fits acisf05135N002 cntr img2.fits

Summary Page Created:Thu May 25, 2006 05:00 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590333

Instrument: ACIS Obs ID: 5135 Source: E0102-72[S4,-120,-9.15,0,0] PI: Dr. CXC Calibration Title: AO5B ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-25T08:26:25 Date and time of file creation DATE-OBS 2004-04-10T12:59:15 Observation start date DATE-END 2004-04-10T15:36:41 Observation end date RA PNT 15.504019762488 Pointing RA DEC PNT -72.020451050415 Pointing Dec ROLL PNT 176.27844480466 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-25T08:59:57 Date and time of file creation DATE-OBS 2004-04-10T12:59:15 Observation start date DATE-END 2004-04-10T15:36:41 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S4,-120,-9.15,0,0] Source name TITLE AO5B ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5135 Observation id SEQ NUM 590333 Sequence number RA NOM 15.504019762488 Nominal RA DEC NOM -72.020451050415 Nominal Dec ROLL NOM 176.27844480466 Nominal Roll

Summary Page Created:Thu May 25, 2006 05:00 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590333

Instrument: ACIS Obs ID: 5135 Source: E0102-72[S4,-120,-9.15,0,0] PI: Dr. CXC Calibration Title: AO5B ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.000634 -72.033079 3238.000000 113.325111 28.572660 16.000825 -72.029415 2887.367432 108.904930 26.512733 16.018433 -72.032751 2433.862061 103.537018 23.507168 15.906265 -72.025932 297.041656 19.901161 14.925846 15.406407 -72.071897 185.142853 15.249730 12.140730 15.905258 -72.026078 206.170456 19.253777 10.708054 14.534764 -71.935218 139.392029 24.030027 5.800744 14.527111 -71.997956 176.242523 31.492903 5.596262 14.506626 -72.056956 146.043182 27.397654 5.330500 15.024111 -71.956352 51.089657 10.183564 5.016873