Summary Page Created:Thu May 25, 2006 05:10 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590334

Instrument: ACIS Obs ID: 5136 Source: E0102-72[S5,-120,-17.29,0,0] PI: Dr. CXC Calibration Title: AO5B ACIS-S Calibration Observations of E0102-72

acisf05136N002 full img2.fits acisf05136N002 cntr img2.fits

Summary Page Created:Thu May 25, 2006 05:10 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590334

Instrument: ACIS Obs ID: 5136 Source: E0102-72[S5,-120,-17.29,0,0] PI: Dr. CXC Calibration Title: AO5B ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-25T08:34:33 Date and time of file creation DATE-OBS 2004-04-10T15:36:41 Observation start date DATE-END 2004-04-10T18:03:20 Observation end date RA PNT 15.066114156953 Pointing RA DEC PNT -72.010105388575 Pointing Dec ROLL PNT 175.73002827861 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-25T09:09:03 Date and time of file creation DATE-OBS 2004-04-10T15:36:41 Observation start date DATE-END 2004-04-10T18:03:20 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S5,-120,-17.29,0,0] Source name TITLE AO5B ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5136 Observation id SEQ NUM 590334 Sequence number RA NOM 15.066114156953 Nominal RA DEC NOM -72.010105388575 Nominal Dec ROLL NOM 175.73002827861 Nominal Roll

Summary Page Created:Thu May 25, 2006 05:10 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590334

Instrument: ACIS Obs ID: 5136 Source: E0102-72[S5,-120,-17.29,0,0] PI: Dr. CXC Calibration Title: AO5B ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.005895 -72.031556 14589.909180 141.186508 103.337845 15.406195 -72.071745 198.352280 16.373251 12.114410 14.455516 -72.042663 297.500000 25.468235 11.681217 15.908452 -72.026832 161.852280 17.771040 9.107642 15.907654 -72.026328 148.026031 17.782198 8.324394 14.067940 -72.045829 187.544846 24.968735 7.511187 15.023888 -71.956476 59.477272 9.692044 6.136711 15.065730 -72.078694 41.000000 7.837658 5.231154 14.098198 -71.923637 130.099670 25.279589 5.146431 14.174143 -71.924799 130.916077 27.482622 4.763595