Summary Page Created:Sat May 20, 2006 08:04 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590335

Instrument: ACIS Obs ID: 5137 Source: E0102-72[I3,-120,-7,0.5,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

acisf05137N002 full img2.fits acisf05137N002 cntr img2.fits

Summary Page Created:Sat May 20, 2006 08:04 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590335

Instrument: ACIS Obs ID: 5137 Source: E0102-72[I3,-120,-7,0.5,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-20T11:46:08 Date and time of file creation DATE-OBS 2004-04-28T00:27:44 Observation start date DATE-END 2004-04-28T03:02:43 Observation end date RA PNT 15.650934986378 Pointing RA DEC PNT -71.982758699685 Pointing Dec ROLL PNT 160.8486380536 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-20T12:03:50 Date and time of file creation DATE-OBS 2004-04-28T00:27:44 Observation start date DATE-END 2004-04-28T03:02:43 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I3,-120,-7,0.5,0] Source name TITLE AO5B ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5137 Observation id SEQ NUM 590335 Sequence number RA NOM 15.650934986378 Nominal RA DEC NOM -71.982758699685 Nominal Dec ROLL NOM 160.8486380536 Nominal Roll

Summary Page Created:Sat May 20, 2006 08:04 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590335

Instrument: ACIS Obs ID: 5137 Source: E0102-72[I3,-120,-7,0.5,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.017411 -72.033953 1494.068237 68.405212 21.841436 16.002138 -72.034726 1333.317261 69.092140 19.297670 16.005324 -72.027543 1188.565552 66.375992 17.906559 15.179627 -72.192611 343.627594 24.245007 14.173128 16.020351 -72.029116 680.159119 57.692692 11.789346 15.406180 -72.072063 174.075867 15.275608 11.395675 15.181979 -72.194422 231.409088 23.882732 9.689389 15.906273 -72.026016 79.875000 10.602337 7.533717 15.431180 -71.908809 70.238640 9.961490 7.051018 14.881995 -72.173332 119.791962 20.975616 5.711010