Summary Page Created:Sat May 20, 2006 08:32 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590336

Instrument: ACIS Obs ID: 5138 Source: E0102-72[I3,-120,-4,0.5,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

acisf05138N002 full img2.fits acisf05138N002 cntr img2.fits

Summary Page Created:Sat May 20, 2006 08:32 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590336

Instrument: ACIS Obs ID: 5138 Source: E0102-72[I3,-120,-4,0.5,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-20T11:55:21 Date and time of file creation DATE-OBS 2004-04-28T03:02:43 Observation start date DATE-END 2004-04-28T05:44:30 Observation end date RA PNT 15.803896084497 Pointing RA DEC PNT -71.999174060004 Pointing Dec ROLL PNT 160.88941490511 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-20T12:31:46 Date and time of file creation DATE-OBS 2004-04-28T03:02:43 Observation start date DATE-END 2004-04-28T05:44:30 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I3,-120,-4,0.5,0] Source name TITLE AO5B ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5138 Observation id SEQ NUM 590336 Sequence number RA NOM 15.803896084497 Nominal RA DEC NOM -71.999174060004 Nominal Dec ROLL NOM 160.88941490511 Nominal Roll

Summary Page Created:Sat May 20, 2006 08:32 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590336

Instrument: ACIS Obs ID: 5138 Source: E0102-72[I3,-120,-4,0.5,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.178518 -72.193041 311.708344 23.291328 13.383021 16.004081 -72.034645 629.714294 51.868050 12.140697 16.014858 -72.035056 547.285706 45.224964 12.101408 16.019608 -72.032976 547.714294 49.354378 11.097583 15.999039 -72.028557 476.000000 46.781628 10.174934 15.407664 -72.072205 140.750000 14.710207 9.568187 16.009172 -72.031933 269.428558 32.512951 8.286808 15.906473 -72.025936 85.142860 11.133356 7.647546 16.007598 -72.027465 318.285706 47.063782 6.762859 15.997094 -72.031344 320.714294 48.491573 6.613815