Summary Page Created:Sat May 20, 2006 09:00 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590338

Instrument: ACIS Obs ID: 5140 Source: E0102-72[I3,-120,-4.0,2.5,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

acisf05140N002 full img2.fits acisf05140N002 cntr img2.fits

Summary Page Created:Sat May 20, 2006 09:00 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590338

Instrument: ACIS Obs ID: 5140 Source: E0102-72[I3,-120,-4.0,2.5,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-20T12:29:42 Date and time of file creation DATE-OBS 2004-04-30T16:57:54 Observation start date DATE-END 2004-04-30T19:32:53 Observation end date RA PNT 15.847860945171 Pointing RA DEC PNT -71.965696332404 Pointing Dec ROLL PNT 158.66781763447 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-20T12:59:48 Date and time of file creation DATE-OBS 2004-04-30T16:57:54 Observation start date DATE-END 2004-04-30T19:32:53 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I3,-120,-4.0,2.5,0] Source name TITLE AO5B ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5140 Observation id SEQ NUM 590338 Sequence number RA NOM 15.847860945171 Nominal RA DEC NOM -71.965696332404 Nominal Dec ROLL NOM 158.66781763447 Nominal Roll

Summary Page Created:Sat May 20, 2006 09:00 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590338

Instrument: ACIS Obs ID: 5140 Source: E0102-72[I3,-120,-4.0,2.5,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.018694 -72.033231 733.750000 49.696857 14.764515 15.804635 -72.154122 364.458344 24.730110 14.737432 16.004654 -72.035128 699.166687 54.202793 12.899089 15.180608 -72.193234 310.664459 24.342014 12.762479 16.013930 -72.035185 564.750000 46.240540 12.213309 15.996848 -72.031256 397.428558 45.273018 8.778486 16.003737 -72.027970 422.571442 48.159504 8.774414 16.020360 -72.029751 385.083344 45.760189 8.415248 15.906527 -72.025951 85.238640 10.765553 7.917719 16.009036 -72.027337 355.714294 47.535732 7.483093