Summary Page Created:Sat May 20, 2006 09:01 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590339

Instrument: ACIS Obs ID: 5141 Source: E0102-72[I3,-120,-4.0,4.5,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

acisf05141N002 full img2.fits acisf05141N002 cntr img2.fits

Summary Page Created:Sat May 20, 2006 09:01 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590339

Instrument: ACIS Obs ID: 5141 Source: E0102-72[I3,-120,-4.0,4.5,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-20T12:29:24 Date and time of file creation DATE-OBS 2004-04-30T19:32:53 Observation start date DATE-END 2004-04-30T21:54:43 Observation end date RA PNT 15.887764634224 Pointing RA DEC PNT -71.934602088958 Pointing Dec ROLL PNT 158.59871426385 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-20T13:00:14 Date and time of file creation DATE-OBS 2004-04-30T19:32:53 Observation start date DATE-END 2004-04-30T21:54:43 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I3,-120,-4.0,4.5,0] Source name TITLE AO5B ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5141 Observation id SEQ NUM 590339 Sequence number RA NOM 15.887764634224 Nominal RA DEC NOM -71.934602088958 Nominal Dec ROLL NOM 158.59871426385 Nominal Roll

Summary Page Created:Sat May 20, 2006 09:01 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590339

Instrument: ACIS Obs ID: 5141 Source: E0102-72[I3,-120,-4.0,4.5,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.019945 -72.033008 1078.354980 62.440182 17.270208 16.004991 -72.034889 1055.935059 66.819000 15.802916 15.999456 -72.028775 852.522705 56.314541 15.138590 15.806774 -72.154102 416.750671 30.061977 13.863050 16.007330 -72.027323 669.079529 54.738998 12.223087 15.997004 -72.031365 665.829529 55.071995 12.090165 16.012403 -72.027227 597.488647 52.221321 11.441469 15.804308 -72.152761 277.029907 28.746193 9.637099 16.017726 -72.028091 468.181824 48.803802 9.593143 16.020444 -72.029659 394.295441 48.284515 8.166085