Summary Page Created:Sat May 20, 2006 09:06 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590340

Instrument: ACIS Obs ID: 5142 Source: E0102-72[I3,-120,-4.0,6.5,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

acisf05142N002 full img2.fits acisf05142N002 cntr img2.fits

Summary Page Created:Sat May 20, 2006 09:06 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590340

Instrument: ACIS Obs ID: 5142 Source: E0102-72[I3,-120,-4.0,6.5,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-20T12:37:07 Date and time of file creation DATE-OBS 2004-04-30T21:54:43 Observation start date DATE-END 2004-05-01T00:45:24 Observation end date RA PNT 15.928076545854 Pointing RA DEC PNT -71.903581430244 Pointing Dec ROLL PNT 158.54622334167 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-20T13:05:41 Date and time of file creation DATE-OBS 2004-04-30T21:54:43 Observation start date DATE-END 2004-05-01T00:45:24 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I3,-120,-4.0,6.5,0] Source name TITLE AO5B ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5142 Observation id SEQ NUM 590340 Sequence number RA NOM 15.928076545854 Nominal RA DEC NOM -71.903581430244 Nominal Dec ROLL NOM 158.54622334167 Nominal Roll

Summary Page Created:Sat May 20, 2006 09:06 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590340

Instrument: ACIS Obs ID: 5142 Source: E0102-72[I3,-120,-4.0,6.5,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.002912 -72.034428 1710.291626 77.116722 22.177961 16.003689 -72.027834 1272.284058 66.258614 19.201792 16.019289 -72.033262 1276.125000 67.644012 18.865307 15.811883 -72.153586 385.848267 31.673752 12.181956 15.405573 -72.071686 96.294121 13.973084 6.891400 15.906732 -72.025833 53.041378 9.432806 5.623075 15.432039 -71.908642 42.487499 8.817498 4.818544 15.907160 -72.025870 46.113636 9.801089 4.704950 15.881426 -72.217485 107.558136 24.515280 4.387392 15.811981 -72.220689 104.253326 25.912462 4.023289