Summary Page Created:Sat May 20, 2006 06:57 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590341

Instrument: ACIS Obs ID: 5143 Source: E0102-72[I0,-120,4.7,-5.68,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

acisf05143N002 full img2.fits acisf05143N002 cntr img2.fits

Summary Page Created:Sat May 20, 2006 06:57 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590341

Instrument: ACIS Obs ID: 5143 Source: E0102-72[I0,-120,4.7,-5.68,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-20T10:29:01 Date and time of file creation DATE-OBS 2004-04-26T10:49:37 Observation start date DATE-END 2004-04-26T13:14:29 Observation end date RA PNT 16.148268423979 Pointing RA DEC PNT -72.14297274967 Pointing Dec ROLL PNT 162.67259688095 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-20T10:57:10 Date and time of file creation DATE-OBS 2004-04-26T10:49:37 Observation start date DATE-END 2004-04-26T13:14:29 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I0,-120,4.7,-5.68,0] Source name TITLE AO5B ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5143 Observation id SEQ NUM 590341 Sequence number RA NOM 16.148268423979 Nominal RA DEC NOM -72.14297274967 Nominal Dec ROLL NOM 162.67259688095 Nominal Roll

Summary Page Created:Sat May 20, 2006 06:57 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590341

Instrument: ACIS Obs ID: 5143 Source: E0102-72[I0,-120,4.7,-5.68,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.019885 -72.032611 1162.406860 61.196831 18.994560 15.807904 -72.154035 447.642487 23.668812 18.912758 16.004630 -72.027558 1181.738647 66.325439 17.817276 16.002976 -72.034581 1184.089600 69.628761 17.005754 15.996865 -72.031431 862.482788 63.631172 13.554406 16.020005 -72.029221 724.889648 56.087299 12.924310 16.389973 -72.247024 192.397720 15.383653 12.506635 15.467371 -72.395261 161.994019 19.943356 8.122706 16.390686 -72.247044 125.583336 15.484515 8.110253 15.907111 -72.025997 95.113640 12.266148 7.754157