Summary Page Created:Sat May 20, 2006 07:00 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590342

Instrument: ACIS Obs ID: 5144 Source: E0102-72[I1,-120,-4.0,-3.68,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

acisf05144N002 full img2.fits acisf05144N002 cntr img2.fits

Summary Page Created:Sat May 20, 2006 07:00 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590342

Instrument: ACIS Obs ID: 5144 Source: E0102-72[I1,-120,-4.0,-3.68,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-20T10:32:34 Date and time of file creation DATE-OBS 2004-04-26T13:14:29 Observation start date DATE-END 2004-04-26T15:27:40 Observation end date RA PNT 15.731506676475 Pointing RA DEC PNT -72.066866681074 Pointing Dec ROLL PNT 162.1708352239 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-20T10:59:12 Date and time of file creation DATE-OBS 2004-04-26T13:14:29 Observation start date DATE-END 2004-04-26T15:27:40 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I1,-120,-4.0,-3.68,0] Source name TITLE AO5B ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5144 Observation id SEQ NUM 590342 Sequence number RA NOM 15.731506676475 Nominal RA DEC NOM -72.066866681074 Nominal Dec ROLL NOM 162.1708352239 Nominal Roll

Summary Page Created:Sat May 20, 2006 07:00 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590342

Instrument: ACIS Obs ID: 5144 Source: E0102-72[I1,-120,-4.0,-3.68,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.018984 -72.033060 932.238647 54.313656 17.163982 15.807756 -72.154040 386.583344 22.725664 17.010872 15.999516 -72.028421 608.333313 49.149307 12.377252 15.406285 -72.072042 185.715912 15.429173 12.036674 16.003668 -72.034547 606.083313 51.350437 11.802885 15.997161 -72.031074 555.750000 49.446907 11.239328 16.007814 -72.027338 550.340881 51.280636 10.731944 16.018662 -72.028943 442.704559 46.739094 9.471826 16.012972 -72.035157 366.041656 43.798038 8.357491 15.906395 -72.025965 89.142860 11.330015 7.867850