Summary Page Created:Sat May 20, 2006 07:01 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590343

Instrument: ACIS Obs ID: 5145 Source: E0102-72[I2,-120,4.7,2.5,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

acisf05145N002 full img2.fits acisf05145N002 cntr img2.fits

Summary Page Created:Sat May 20, 2006 07:01 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590343

Instrument: ACIS Obs ID: 5145 Source: E0102-72[I2,-120,4.7,2.5,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-20T10:37:13 Date and time of file creation DATE-OBS 2004-04-26T15:27:40 Observation start date DATE-END 2004-04-26T17:50:15 Observation end date RA PNT 16.281325907529 Pointing RA DEC PNT -72.013203198289 Pointing Dec ROLL PNT 162.61868889368 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-20T11:01:09 Date and time of file creation DATE-OBS 2004-04-26T15:27:40 Observation start date DATE-END 2004-04-26T17:50:15 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I2,-120,4.7,2.5,0] Source name TITLE AO5B ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5145 Observation id SEQ NUM 590343 Sequence number RA NOM 16.281325907529 Nominal RA DEC NOM -72.013203198289 Nominal Dec ROLL NOM 162.61868889368 Nominal Roll

Summary Page Created:Sat May 20, 2006 07:01 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590343

Instrument: ACIS Obs ID: 5145 Source: E0102-72[I2,-120,4.7,2.5,0] PI: Dr. CXC Calibration Title: AO5B ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.019640 -72.032838 731.666687 50.245895 14.561721 15.807573 -72.154673 244.190186 19.401831 12.585935 16.004006 -72.034764 660.750000 54.041294 12.226762 16.015352 -72.034837 548.583313 48.385353 11.337797 16.000060 -72.028165 512.541687 46.914242 10.925076 15.997581 -72.031397 543.125000 50.174831 10.824650 16.010792 -72.026828 422.583344 45.315353 9.325390 15.906471 -72.025936 91.055176 11.669436 7.802877 16.017352 -72.028060 326.333344 43.150005 7.562765 16.391375 -72.246572 106.196075 18.954353 5.602727