Summary Page Created:Fri June 23, 2006 14:58 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590344

Instrument: ACIS Obs ID: 5146 Source: E0102-72[I3,-120,-7,0.5,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

acisf05146N002 full img2.fits acisf05146N002 cntr img2.fits

Summary Page Created:Fri June 23, 2006 14:58 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590344

Instrument: ACIS Obs ID: 5146 Source: E0102-72[I3,-120,-7,0.5,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-23T18:40:01 Date and time of file creation DATE-OBS 2003-12-16T01:09:02 Observation start date DATE-END 2003-12-16T04:21:37 Observation end date RA PNT 16.17022054393 Pointing RA DEC PNT -72.142853258044 Pointing Dec ROLL PNT 299.05242987409 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-23T18:57:09 Date and time of file creation DATE-OBS 2003-12-16T01:09:02 Observation start date DATE-END 2003-12-16T04:21:37 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I3,-120,-7,0.5,0] Source name TITLE AO5A ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5146 Observation id SEQ NUM 590344 Sequence number RA NOM 16.17022054393 Nominal RA DEC NOM -72.142853258044 Nominal Dec ROLL NOM 299.05242987409 Nominal Roll

Summary Page Created:Fri June 23, 2006 14:58 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590344

Instrument: ACIS Obs ID: 5146 Source: E0102-72[I3,-120,-7,0.5,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.003533 -72.034462 1440.758667 70.798897 20.350016 16.006620 -72.027339 1344.250000 67.815323 19.822218 16.017974 -72.033460 1209.765503 66.978027 18.062124 15.808099 -72.153937 263.179993 18.050554 14.580162 15.998510 -72.032104 993.431824 75.772499 13.110718 16.290242 -72.196378 61.318180 9.567231 6.409188 16.401710 -72.163454 55.142857 9.511253 5.797644 16.480103 -72.064090 43.556820 8.839024 4.927786 16.387373 -72.225244 39.692501 8.274058 4.797223 16.876491 -71.901528 90.349731 21.131516 4.275592