Summary Page Created:Thu June 22, 2006 00:33 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590345

Instrument: ACIS Obs ID: 5147 Source: E0102-72[I3,-120,-4,0.5,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

acisf05147N002 full img2.fits acisf05147N002 cntr img2.fits

Summary Page Created:Thu June 22, 2006 00:33 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590345

Instrument: ACIS Obs ID: 5147 Source: E0102-72[I3,-120,-4,0.5,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-22T04:21:41 Date and time of file creation DATE-OBS 2003-12-19T01:58:16 Observation start date DATE-END 2003-12-19T04:41:27 Observation end date RA PNT 16.080430106975 Pointing RA DEC PNT -72.100292957683 Pointing Dec ROLL PNT 295.97556558036 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-22T04:32:35 Date and time of file creation DATE-OBS 2003-12-19T01:58:16 Observation start date DATE-END 2003-12-19T04:41:27 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I3,-120,-4,0.5,0] Source name TITLE AO5A ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5147 Observation id SEQ NUM 590345 Sequence number RA NOM 16.080430106975 Nominal RA DEC NOM -72.100292957683 Nominal Dec ROLL NOM 295.97556558036 Nominal Roll

Summary Page Created:Thu June 22, 2006 00:33 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590345

Instrument: ACIS Obs ID: 5147 Source: E0102-72[I3,-120,-4,0.5,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.807973 -72.153956 274.034088 18.449862 14.852907 16.000683 -72.028192 533.857117 49.302540 10.828187 16.019649 -72.033027 520.857117 50.868942 10.239198 16.015243 -72.034707 463.000000 48.652000 9.516566 16.004334 -72.035055 437.285706 48.347923 9.044560 16.009608 -72.027035 394.857147 47.382900 8.333326 16.011397 -72.035205 342.142853 41.700531 8.204761 16.020411 -72.030921 307.714294 40.408897 7.615014 15.906804 -72.025838 92.416664 12.447288 7.424643 16.401704 -72.163397 57.006897 8.966677 6.357639