Summary Page Created:Thu June 22, 2006 01:37 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590346

Instrument: ACIS Obs ID: 5148 Source: E0102-72[I3,-120,-0.5,0.5,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

acisf05148N002 full img2.fits acisf05148N002 cntr img2.fits

Summary Page Created:Thu June 22, 2006 01:37 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590346

Instrument: ACIS Obs ID: 5148 Source: E0102-72[I3,-120,-0.5,0.5,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-22T04:56:50 Date and time of file creation DATE-OBS 2003-12-19T04:41:27 Observation start date DATE-END 2003-12-19T10:19:38 Observation end date RA PNT 15.997974269515 Pointing RA DEC PNT -72.047767006185 Pointing Dec ROLL PNT 295.78700789087 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-22T05:36:20 Date and time of file creation DATE-OBS 2003-12-19T04:41:27 Observation start date DATE-END 2003-12-19T10:19:38 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I3,-120,-0.5,0.5,0] Source name TITLE AO5A ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5148 Observation id SEQ NUM 590346 Sequence number RA NOM 15.997974269515 Nominal RA DEC NOM -72.047767006185 Nominal Dec ROLL NOM 295.78700789087 Nominal Roll

Summary Page Created:Thu June 22, 2006 01:37 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590346

Instrument: ACIS Obs ID: 5148 Source: E0102-72[I3,-120,-0.5,0.5,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.808115 -72.153906 545.275879 26.247330 20.774527 15.906531 -72.025858 196.571426 15.886603 12.373408 16.019224 -72.032718 504.000000 51.205303 9.842731 15.999719 -72.028328 482.142853 49.595486 9.721507 16.017556 -72.033830 459.000000 47.947659 9.572939 16.002460 -72.034833 439.285706 47.926624 9.165797 16.015684 -72.034863 438.857147 48.301670 9.085755 16.008747 -72.031958 300.714294 35.187149 8.546139 16.480583 -72.063781 100.113640 12.487291 8.017241 15.997028 -72.031110 370.571442 47.150566 7.859321