Summary Page Created:Thu June 22, 2006 00:31 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590347

Instrument: ACIS Obs ID: 5149 Source: E0102-72[I3,-120,-4.0,2.5,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

acisf05149N002 full img2.fits acisf05149N002 cntr img2.fits

Summary Page Created:Thu June 22, 2006 00:31 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590347

Instrument: ACIS Obs ID: 5149 Source: E0102-72[I3,-120,-4.0,2.5,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-22T04:14:11 Date and time of file creation DATE-OBS 2003-12-19T10:19:38 Observation start date DATE-END 2003-12-19T12:40:01 Observation end date RA PNT 15.980858903964 Pointing RA DEC PNT -72.114746102433 Pointing Dec ROLL PNT 295.52060329245 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-22T04:29:42 Date and time of file creation DATE-OBS 2003-12-19T10:19:38 Observation start date DATE-END 2003-12-19T12:40:01 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I3,-120,-4.0,2.5,0] Source name TITLE AO5A ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5149 Observation id SEQ NUM 590347 Sequence number RA NOM 15.980858903964 Nominal RA DEC NOM -72.114746102433 Nominal Dec ROLL NOM 295.52060329245 Nominal Roll

Summary Page Created:Thu June 22, 2006 00:31 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590347

Instrument: ACIS Obs ID: 5149 Source: E0102-72[I3,-120,-4.0,2.5,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.020129 -72.032695 743.916687 50.760849 14.655324 15.808124 -72.153911 249.571426 17.575062 14.200315 16.000690 -72.028026 648.833313 47.675022 13.609503 15.996601 -72.030729 564.000000 50.453041 11.178712 16.011420 -72.026699 492.958344 44.727837 11.021287 16.014665 -72.034919 441.142853 42.908688 10.280969 15.406794 -72.071734 145.193176 14.385562 10.092979 16.003716 -72.034463 490.285706 49.984886 9.808679 16.009162 -72.031480 287.083344 34.611786 8.294381 16.016238 -72.027907 314.916656 45.642811 6.899590