Summary Page Created:Thu June 22, 2006 00:38 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590348

Instrument: ACIS Obs ID: 5150 Source: E0102-72[I3,-120,-4.0,4.5,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

acisf05150N002 full img2.fits acisf05150N002 cntr img2.fits

Summary Page Created:Thu June 22, 2006 00:38 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590348

Instrument: ACIS Obs ID: 5150 Source: E0102-72[I3,-120,-4.0,4.5,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-22T04:23:22 Date and time of file creation DATE-OBS 2003-12-19T12:40:01 Observation start date DATE-END 2003-12-19T15:00:25 Observation end date RA PNT 15.88222196137 Pointing RA DEC PNT -72.128880152741 Pointing Dec ROLL PNT 295.32942190982 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-22T04:37:45 Date and time of file creation DATE-OBS 2003-12-19T12:40:01 Observation start date DATE-END 2003-12-19T15:00:25 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I3,-120,-4.0,4.5,0] Source name TITLE AO5A ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5150 Observation id SEQ NUM 590348 Sequence number RA NOM 15.88222196137 Nominal RA DEC NOM -72.128880152741 Nominal Dec ROLL NOM 295.32942190982 Nominal Roll

Summary Page Created:Thu June 22, 2006 00:38 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590348

Instrument: ACIS Obs ID: 5150 Source: E0102-72[I3,-120,-4.0,4.5,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.018069 -72.033953 1002.174988 61.660263 16.253174 16.008965 -72.027277 956.437500 63.095657 15.158531 15.807973 -72.153919 274.000000 18.496159 14.813887 16.004310 -72.034545 894.045471 60.670574 14.736064 16.000063 -72.028373 936.440002 63.665436 14.708766 16.018241 -72.028380 679.222473 57.719517 11.767640 15.997167 -72.031205 747.294983 64.713623 11.547724 15.406204 -72.072065 124.462502 14.020316 8.877296 15.906589 -72.025908 69.692497 10.119627 6.886864 16.748567 -71.976181 123.558136 24.857470 4.970665