Summary Page Created:Thu June 22, 2006 01:09 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590349

Instrument: ACIS Obs ID: 5151 Source: E0102-72[S3,-120,-3,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

acisf05151N002 full img2.fits acisf05151N002 cntr img2.fits

Summary Page Created:Thu June 22, 2006 01:09 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590349

Instrument: ACIS Obs ID: 5151 Source: E0102-72[S3,-120,-3,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-22T04:33:07 Date and time of file creation DATE-OBS 2003-12-19T15:00:25 Observation start date DATE-END 2003-12-19T17:23:50 Observation end date RA PNT 15.783333650297 Pointing RA DEC PNT -72.142902157783 Pointing Dec ROLL PNT 295.13746298581 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.76843262 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-22T05:07:50 Date and time of file creation DATE-OBS 2003-12-19T15:00:25 Observation start date DATE-END 2003-12-19T17:23:50 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[S3,-120,-3,0,0] Source name TITLE AO5A ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5151 Observation id SEQ NUM 590349 Sequence number RA NOM 15.783333650297 Nominal RA DEC NOM -72.142902157783 Nominal Dec ROLL NOM 295.13746298581 Nominal Roll

Summary Page Created:Thu June 22, 2006 01:09 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590349

Instrument: ACIS Obs ID: 5151 Source: E0102-72[S3,-120,-3,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.261791 -72.116466 834.005005 33.180527 25.135374 16.002464 -72.034322 1570.397705 70.969032 22.127930 16.017751 -72.033351 1372.666626 73.674179 18.631584 16.004313 -72.027840 1253.791626 74.570969 16.813402 16.016988 -72.028021 1014.000000 64.485245 15.724527 15.808001 -72.153899 266.285706 18.174212 14.651844 15.406145 -72.071924 190.666672 15.684877 12.156083 15.999560 -72.032090 855.375000 81.128304 10.543484 15.906598 -72.025801 45.556820 8.966960 5.080520 15.687040 -72.256126 39.027588 8.243100 4.734576