Summary Page Created:Thu June 22, 2006 01:33 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590350

Instrument: ACIS Obs ID: 5152 Source: E0102-72[S3,-120,-5,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

acisf05152N002 full img2.fits acisf05152N002 cntr img2.fits

Summary Page Created:Thu June 22, 2006 01:33 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590350

Instrument: ACIS Obs ID: 5152 Source: E0102-72[S3,-120,-5,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-22T04:51:41 Date and time of file creation DATE-OBS 2003-12-22T07:48:22 Observation start date DATE-END 2003-12-22T10:26:11 Observation end date RA PNT 16.195245272775 Pointing RA DEC PNT -71.92802140508 Pointing Dec ROLL PNT 292.85433504822 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-22T05:32:02 Date and time of file creation DATE-OBS 2003-12-22T07:48:22 Observation start date DATE-END 2003-12-22T10:26:11 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[S3,-120,-5,0,0] Source name TITLE AO5A ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5152 Observation id SEQ NUM 590350 Sequence number RA NOM 16.195245272775 Nominal RA DEC NOM -71.92802140508 Nominal Dec ROLL NOM 292.85433504822 Nominal Roll

Summary Page Created:Thu June 22, 2006 01:33 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590350

Instrument: ACIS Obs ID: 5152 Source: E0102-72[S3,-120,-5,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.017750 -72.033885 1399.172363 67.119469 20.846001 16.000728 -72.034484 1291.613647 69.630821 18.549452 16.004066 -72.027645 1167.282715 67.782616 17.220976 15.997390 -72.030733 894.165527 67.638634 13.219745 16.020914 -72.029648 660.186218 58.832436 11.221466 16.966596 -71.715093 133.592422 25.252535 5.290258 17.046468 -71.762857 86.558136 24.058029 3.597890 16.916528 -71.873772 32.830452 9.432006 3.480750 17.075012 -71.788664 89.126244 26.817249 3.323467 15.904549 -72.025679 22.875000 6.888441 3.320781