Summary Page Created:Fri June 23, 2006 16:35 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590351

Instrument: ACIS Obs ID: 5153 Source: E0102-72[I1,-120,-4.0,-3.68,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

acisf05153N002 full img2.fits acisf05153N002 cntr img2.fits

Summary Page Created:Fri June 23, 2006 16:35 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590351

Instrument: ACIS Obs ID: 5153 Source: E0102-72[I1,-120,-4.0,-3.68,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-23T20:20:41 Date and time of file creation DATE-OBS 2003-12-16T22:27:00 Observation start date DATE-END 2003-12-17T00:55:28 Observation end date RA PNT 16.288407854698 Pointing RA DEC PNT -72.066756087364 Pointing Dec ROLL PNT 298.31725317715 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-23T20:33:54 Date and time of file creation DATE-OBS 2003-12-16T22:27:00 Observation start date DATE-END 2003-12-17T00:55:28 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I1,-120,-4.0,-3.68,0] Source name TITLE AO5A ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5153 Observation id SEQ NUM 590351 Sequence number RA NOM 16.288407854698 Nominal RA DEC NOM -72.066756087364 Nominal Dec ROLL NOM 298.31725317715 Nominal Roll

Summary Page Created:Fri June 23, 2006 16:35 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590351

Instrument: ACIS Obs ID: 5153 Source: E0102-72[I1,-120,-4.0,-3.68,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 15.999092 -72.028766 830.693176 55.743256 14.902128 16.003925 -72.034555 836.545471 60.842415 13.749380 16.019664 -72.032992 667.166687 49.847767 13.384083 16.015435 -72.034880 580.500000 45.987144 12.623094 15.996718 -72.030532 660.250000 54.273430 12.165253 16.009342 -72.027168 582.875000 52.598072 11.081680 15.906937 -72.025825 121.477272 12.740634 9.534633 16.020018 -72.029566 336.958344 40.351162 8.350647 16.008810 -72.032340 251.833328 37.250782 6.760485 16.017757 -72.028309 270.208344 41.925568 6.444954