Summary Page Created:Fri June 23, 2006 16:56 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590352

Instrument: ACIS Obs ID: 5154 Source: E0102-72[I2,-120,4.7,2.5,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

acisf05154N002 full img2.fits acisf05154N002 cntr img2.fits

Summary Page Created:Fri June 23, 2006 16:56 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590352

Instrument: ACIS Obs ID: 5154 Source: E0102-72[I2,-120,4.7,2.5,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-23T20:30:36 Date and time of file creation DATE-OBS 2003-12-17T00:55:28 Observation start date DATE-END 2003-12-17T03:16:49 Observation end date RA PNT 15.774059429652 Pointing RA DEC PNT -71.986606135085 Pointing Dec ROLL PNT 297.7593080096 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-23T20:54:55 Date and time of file creation DATE-OBS 2003-12-17T00:55:28 Observation start date DATE-END 2003-12-17T03:16:49 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT E0102-72[I2,-120,4.7,2.5,0] Source name TITLE AO5A ACIS-I Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5154 Observation id SEQ NUM 590352 Sequence number RA NOM 15.774059429652 Nominal RA DEC NOM -71.986606135085 Nominal Dec ROLL NOM 297.7593080096 Nominal Roll

Summary Page Created:Fri June 23, 2006 16:56 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590352

Instrument: ACIS Obs ID: 5154 Source: E0102-72[I2,-120,4.7,2.5,0] PI: Dr. CXC Calibration Title: AO5A ACIS-I Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.019432 -72.032884 742.250000 51.600288 14.384609 16.017346 -72.034144 580.250000 51.005985 11.376116 16.004244 -72.034804 620.166687 54.903751 11.295525 15.906321 -72.025811 157.318176 14.026790 11.215551 15.997431 -72.030869 556.625000 52.108620 10.682014 15.406542 -72.071872 131.556824 13.245337 9.932311 16.001840 -72.028098 521.791687 52.686485 9.903710 15.999356 -72.028139 392.428558 44.260780 8.866282 16.019817 -72.029391 395.875000 45.424137 8.715080 16.008509 -72.027309 414.666656 50.148693 8.268744