Summary Page Created:Thu April 13, 2006 07:37 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590353

Instrument: ACIS Obs ID: 5155 Source: Cas A[I3,-120,-3.0,3.5,0] PI: Dr. CXC Calibration Title: AO5B Observations of the Standard Candles Cas A and G21.5-09

acisf05155N002 full img2.fits acisf05155N002 cntr img2.fits

Summary Page Created:Thu April 13, 2006 07:37 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590353

Instrument: ACIS Obs ID: 5155 Source: Cas A[I3,-120,-3.0,3.5,0] PI: Dr. CXC Calibration Title: AO5B Observations of the Standard Candles Cas A and G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-13T11:10:13 Date and time of file creation DATE-OBS 2004-10-29T03:47:14 Observation start date DATE-END 2004-10-29T04:43:44 Observation end date RA PNT 350.70184780646 Pointing RA DEC PNT 58.806940439078 Pointing Dec ROLL PNT 233.83518532935 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-13T11:36:40 Date and time of file creation DATE-OBS 2004-10-29T03:47:14 Observation start date DATE-END 2004-10-29T04:43:44 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT Cas A[I3,-120,-3.0,3.5,0] Source name TITLE AO5B Observations of the Standard Candles Cas A and G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5155 Observation id SEQ NUM 590353 Sequence number RA NOM 350.70184780646 Nominal RA DEC NOM 58.806940439078 Nominal Dec ROLL NOM 233.83518532935 Nominal Roll

Summary Page Created:Thu April 13, 2006 07:37 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590353

Instrument: ACIS Obs ID: 5155 Source: Cas A[I3,-120,-3.0,3.5,0] PI: Dr. CXC Calibration Title: AO5B Observations of the Standard Candles Cas A and G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.897937 58.834650 1238.737549 63.118942 19.625448 350.887154 58.796365 884.125000 52.110645 16.966303 350.927750 58.816610 1046.820679 63.581352 16.464272 350.849452 58.840365 657.833313 49.397781 13.317062 350.881080 58.796239 451.363647 36.218632 12.462194 350.938896 58.819103 480.852264 42.324940 11.360968 350.923383 58.812156 685.324158 61.817974 11.086163 350.870669 58.828698 310.208344 28.987129 10.701589 350.912168 58.803938 719.747498 69.093864 10.416953 350.905026 58.817461 389.287506 40.395493 9.636904