Summary Page Created:Thu April 13, 2006 07:37 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590354

Instrument: ACIS Obs ID: 5156 Source: Cas A[S3,-120,-2.0,0,0] PI: Dr. CXC Calibration Title: AO5B Observations of the Standard Candles Cas A and G21.5-09

acisf05156N002 full img2.fits acisf05156N002 cntr img2.fits

Summary Page Created:Thu April 13, 2006 07:37 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590354

Instrument: ACIS Obs ID: 5156 Source: Cas A[S3,-120,-2.0,0,0] PI: Dr. CXC Calibration Title: AO5B Observations of the Standard Candles Cas A and G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-13T11:08:57 Date and time of file creation DATE-OBS 2004-10-29T04:43:44 Observation start date DATE-END 2004-10-29T05:45:49 Observation end date RA PNT 350.8118026459 Pointing RA DEC PNT 58.785688642909 Pointing Dec ROLL PNT 233.7356356308 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-13T11:35:45 Date and time of file creation DATE-OBS 2004-10-29T04:43:44 Observation start date DATE-END 2004-10-29T05:45:49 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT Cas A[S3,-120,-2.0,0,0] Source name TITLE AO5B Observations of the Standard Candles Cas A and G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5156 Observation id SEQ NUM 590354 Sequence number RA NOM 350.8118026459 Nominal RA DEC NOM 58.785688642909 Nominal Dec ROLL NOM 233.7356356308 Nominal Roll

Summary Page Created:Thu April 13, 2006 07:37 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590354

Instrument: ACIS Obs ID: 5156 Source: Cas A[S3,-120,-2.0,0,0] PI: Dr. CXC Calibration Title: AO5B Observations of the Standard Candles Cas A and G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.870304 58.828761 229.261368 22.741531 10.081175 350.848283 58.840267 319.409088 33.955837 9.406603 350.897397 58.834824 468.000000 50.211391 9.320594 350.853863 58.840800 311.000000 38.785912 8.018375 350.952707 58.818307 130.333328 19.272490 6.762662 350.866400 58.811755 85.000000 12.800573 6.640328 350.857674 58.834497 156.431824 23.725311 6.593457 350.881477 58.796332 163.000000 25.166004 6.476992 350.891121 58.835288 216.714279 33.602402 6.449369 350.880276 58.833247 165.714279 26.141808 6.339053