Summary Page Created:Fri November 23, 2007 20:17 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590355

Instrument: HRC Obs ID: 5157 Source: Cas A PI: Dr. CXC Calibration Title: AO5B Observations of the Standard Candles Cas A and G21.5-09

hrcf05157N004 full img2.fits hrcf05157N004 cntr img2.fits

Summary Page Created:Fri November 23, 2007 20:17 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590355

Instrument: HRC Obs ID: 5157 Source: Cas A PI: Dr. CXC Calibration Title: AO5B Observations of the Standard Candles Cas A and G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T01:02:55 Date and time of file creation DATE-OBS 2004-10-29T05:45:49 Observation start date DATE-END 2004-10-29T07:32:23 Observation end date RA PNT 350.85033661592 Pointing RA DEC PNT 58.812562578204 Pointing Dec ROLL PNT 233.47804785627 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-24T01:15:59 Date and time of file creation DATE-OBS 2004-10-29T05:45:49 Observation start date DATE-END 2004-10-29T07:32:23 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT Cas A Source name TITLE AO5B Observations of the Standard Candles Cas A and G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5157 Observation id SEQ NUM 590355 Sequence number RA NOM 350.85033661592 Nominal RA DEC NOM 58.812562578204 Nominal Dec ROLL NOM 233.47804785627 Nominal Roll

Summary Page Created:Fri November 23, 2007 20:17 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590355

Instrument: HRC Obs ID: 5157 Source: Cas A PI: Dr. CXC Calibration Title: AO5B Observations of the Standard Candles Cas A and G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.852961 58.840682 284.250000 28.048729 10.134150 350.848647 58.840063 291.465912 32.491570 8.970509 350.866450 58.811815 122.333336 13.875692 8.816377 350.837551 58.841324 224.965912 27.230829 8.261442 350.881372 58.796338 206.261368 25.659761 8.038320 350.922222 58.812221 212.428574 29.444788 7.214471 350.952884 58.818121 118.916664 18.076508 6.578520 350.886366 58.796734 188.772720 28.973146 6.515438 350.891567 58.835174 132.681824 22.279810 5.955249 350.822545 58.844763 89.714287 16.332109 5.493123