Summary Page Created:Sat February 25, 2006 04:17 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590356

Instrument: ACIS Obs ID: 5158 Source: G21.5-09[I3,-120,-2.5,2.5,0] PI: Dr. CXC Calibration Title: AO5B Observations of the Standard Candles Cas A and G21.5-09

acisf05158N002 full img2.fits acisf05158N002 cntr img2.fits

Summary Page Created:Sat February 25, 2006 04:17 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590356

Instrument: ACIS Obs ID: 5158 Source: G21.5-09[I3,-120,-2.5,2.5,0] PI: Dr. CXC Calibration Title: AO5B Observations of the Standard Candles Cas A and G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-25T08:38:19 Date and time of file creation DATE-OBS 2005-02-26T03:06:59 Observation start date DATE-END 2005-02-26T06:17:51 Observation end date RA PNT 278.43696379871 Pointing RA DEC PNT -10.525769236717 Pointing Dec ROLL PNT 86.142726133699 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7 ASCDS version number DATE 2006-02-25T09:16:06 Date and time of file creation DATE-OBS 2005-02-26T03:06:59 Observation start date DATE-END 2005-02-26T06:17:51 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT G21.5-09[I3,-120,-2.5,2.5,0] Source name TITLE AO5B Observations of the Standard Candles Cas A and G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5158 Observation id SEQ NUM 590356 Sequence number RA NOM 278.43696379871 Nominal RA DEC NOM -10.525769236717 Nominal Dec ROLL NOM 86.142726133699 Nominal Roll

Summary Page Created:Sat February 25, 2006 04:17 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590356

Instrument: ACIS Obs ID: 5158 Source: G21.5-09[I3,-120,-2.5,2.5,0] PI: Dr. CXC Calibration Title: AO5B Observations of the Standard Candles Cas A and G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.389792 -10.568792 1514.079590 55.331619 27.363731 278.368056 -10.402455 127.431816 13.924174 9.151840 278.119311 -10.603168 237.654251 30.411907 7.814513 278.365704 -10.589983 57.477272 9.575342 6.002634 278.123362 -10.571101 162.734222 33.405544 4.871473 278.142981 -10.608947 131.777679 27.314631 4.824436 278.119375 -10.559023 133.897003 27.808729 4.814927 278.125353 -10.487153 116.558136 24.708399 4.717349 278.123412 -10.545264 139.401993 31.291309 4.454975 278.130340 -10.608944 120.674416 28.235001 4.273930