Summary Page Created:Thu April 13, 2006 05:44 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590357

Instrument: ACIS Obs ID: 5159 Source: G21.5-09[S3,-120,-1.0,0,0] PI: Dr. CXC Calibration Title: AO5B Observations of the Standard Candles Cas A and G21.5-09

acisf05159N003 full img2.fits acisf05159N003 cntr img2.fits

Summary Page Created:Thu April 13, 2006 05:44 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590357

Instrument: ACIS Obs ID: 5159 Source: G21.5-09[S3,-120,-1.0,0,0] PI: Dr. CXC Calibration Title: AO5B Observations of the Standard Candles Cas A and G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-13T09:17:10 Date and time of file creation DATE-OBS 2004-10-27T13:34:01 Observation start date DATE-END 2004-10-27T16:50:39 Observation end date RA PNT 278.39139127788 Pointing RA DEC PNT -10.589177373163 Pointing Dec ROLL PNT 279.66616632305 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 31 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.1 ASCDS version number DATE 2006-04-13T09:43:17 Date and time of file creation DATE-OBS 2004-10-27T13:34:01 Observation start date DATE-END 2004-10-27T16:50:39 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT G21.5-09[S3,-120,-1.0,0,0] Source name TITLE AO5B Observations of the Standard Candles Cas A and G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5159 Observation id SEQ NUM 590357 Sequence number RA NOM 278.39139127788 Nominal RA DEC NOM -10.589177373163 Nominal Dec ROLL NOM 279.66616632305 Nominal Roll

Summary Page Created:Thu April 13, 2006 05:44 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590357

Instrument: ACIS Obs ID: 5159 Source: G21.5-09[S3,-120,-1.0,0,0] PI: Dr. CXC Calibration Title: AO5B Observations of the Standard Candles Cas A and G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.389950 -10.568941 826.000000 56.065067 14.732882 278.503918 -10.877180 266.820587 30.244818 8.822027 278.365653 -10.590121 71.857140 10.634652 6.756887 278.367148 -10.402284 93.750000 13.987946 6.702199 278.250147 -10.487260 48.048275 9.263053 5.187089 278.379792 -10.896783 152.382065 30.018339 5.076299 278.379432 -10.889572 148.185715 30.637335 4.836769 278.391159 -10.896961 160.970093 33.726521 4.772805 278.502140 -10.856928 141.166672 29.681740 4.756011 278.501405 -10.846696 131.625000 29.092901 4.524300