Summary Page Created:Mon May 29, 2006 09:15 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590360

Instrument: ACIS Obs ID: 5162 Source: Cas A[I3,-120,-3.0,3.5,0] PI: Dr. CXC Calibration Title: AO5A Observations of the Standard Candles Cas A and G21.5-09

acisf05162N002 full img2.fits acisf05162N002 cntr img2.fits

Summary Page Created:Mon May 29, 2006 09:15 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590360

Instrument: ACIS Obs ID: 5162 Source: Cas A[I3,-120,-3.0,3.5,0] PI: Dr. CXC Calibration Title: AO5A Observations of the Standard Candles Cas A and G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-29T12:50:34 Date and time of file creation DATE-OBS 2004-03-15T21:25:54 Observation start date DATE-END 2004-03-15T22:17:46 Observation end date RA PNT 350.97324736484 Pointing RA DEC PNT 58.760448564263 Pointing Dec ROLL PNT 5.9525353109229 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-29T13:14:16 Date and time of file creation DATE-OBS 2004-03-15T21:25:54 Observation start date DATE-END 2004-03-15T22:17:46 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT Cas A[I3,-120,-3.0,3.5,0] Source name TITLE AO5A Observations of the Standard Candles Cas A and G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5162 Observation id SEQ NUM 590360 Sequence number RA NOM 350.97324736484 Nominal RA DEC NOM 58.760448564263 Nominal Dec ROLL NOM 5.9525353109229 Nominal Roll

Summary Page Created:Mon May 29, 2006 09:15 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590360

Instrument: ACIS Obs ID: 5162 Source: Cas A[I3,-120,-3.0,3.5,0] PI: Dr. CXC Calibration Title: AO5A Observations of the Standard Candles Cas A and G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.848294 58.840049 716.659119 54.470806 13.156756 350.897851 58.834872 719.208313 55.799961 12.889047 350.881372 58.796437 314.113647 26.849041 11.699250 350.885380 58.796526 300.420441 30.403650 9.881065 350.870255 58.828743 272.666656 27.862309 9.786220 350.887649 58.796568 330.409088 34.123466 9.682753 350.833846 58.825186 366.215912 38.696320 9.463843 350.854057 58.840755 438.954559 47.967175 9.151144 350.830758 58.842584 509.019989 57.052067 8.922026 350.841836 58.839852 542.575012 62.472092 8.685078