Summary Page Created:Mon May 29, 2006 09:17 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590361

Instrument: ACIS Obs ID: 5163 Source: Cas A[S3,-120,-2.0,0,0] PI: Dr. CXC Calibration Title: AO5A Observations of the Standard Candles Cas A and G21.5-09

acisf05163N002 full img2.fits acisf05163N002 cntr img2.fits

Summary Page Created:Mon May 29, 2006 09:17 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590361

Instrument: ACIS Obs ID: 5163 Source: Cas A[S3,-120,-2.0,0,0] PI: Dr. CXC Calibration Title: AO5A Observations of the Standard Candles Cas A and G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-29T12:54:53 Date and time of file creation DATE-OBS 2004-03-15T22:17:46 Observation start date DATE-END 2004-03-15T23:19:47 Observation end date RA PNT 350.92993071375 Pointing RA DEC PNT 58.816896659794 Pointing Dec ROLL PNT 5.9905018234293 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DATAMODE FAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-29T13:16:36 Date and time of file creation DATE-OBS 2004-03-15T22:17:46 Observation start date DATE-END 2004-03-15T23:19:47 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT Cas A[S3,-120,-2.0,0,0] Source name TITLE AO5A Observations of the Standard Candles Cas A and G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5163 Observation id SEQ NUM 590361 Sequence number RA NOM 350.92993071375 Nominal RA DEC NOM 58.816896659794 Nominal Dec ROLL NOM 5.9905018234293 Nominal Roll

Summary Page Created:Mon May 29, 2006 09:17 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590361

Instrument: ACIS Obs ID: 5163 Source: Cas A[S3,-120,-2.0,0,0] PI: Dr. CXC Calibration Title: AO5A Observations of the Standard Candles Cas A and G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.848348 58.840257 387.250000 34.923473 11.088531 350.853073 58.840665 289.500000 30.246681 9.571298 350.866384 58.811729 107.857140 13.353571 8.077026 350.870262 58.828655 157.285721 20.028988 7.852904 350.886181 58.796652 201.714279 26.443636 7.628085 350.848288 58.805798 128.909088 19.458366 6.624867 350.821475 58.793262 191.285721 29.650396 6.451371 350.800291 58.822978 130.714279 21.137653 6.183954 350.881413 58.796380 151.857147 25.616718 5.928048 350.830756 58.842760 174.715912 29.889465 5.845401