Summary Page Created:Fri November 23, 2007 18:36 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590362

Instrument: HRC Obs ID: 5164 Source: Cas A PI: Dr. CXC Calibration Title: AO5A Observations of the Standard Candles Cas A and G21.5-09

hrcf05164N003 full img2.fits hrcf05164N003 cntr img2.fits

Summary Page Created:Fri November 23, 2007 18:36 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590362

Instrument: HRC Obs ID: 5164 Source: Cas A PI: Dr. CXC Calibration Title: AO5A Observations of the Standard Candles Cas A and G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-23T23:18:17 Date and time of file creation DATE-OBS 2004-03-15T23:19:47 Observation start date DATE-END 2004-03-16T00:55:05 Observation end date RA PNT 350.86558414445 Pointing RA DEC PNT 58.813748148725 Pointing Dec ROLL PNT 5.8554759940267 Pointing Roll RA TARG 350.8575 Observer’s specified target RA DEC TARG 58.814833 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-23T23:34:22 Date and time of file creation DATE-OBS 2004-03-15T23:19:47 Observation start date DATE-END 2004-03-16T00:55:05 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT Cas A Source name TITLE AO5A Observations of the Standard Candles Cas A and G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5164 Observation id SEQ NUM 590362 Sequence number RA NOM 350.86558414445 Nominal RA DEC NOM 58.813748148725 Nominal Dec ROLL NOM 5.8554759940267 Nominal Roll

Summary Page Created:Fri November 23, 2007 18:36 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590362

Instrument: HRC Obs ID: 5164 Source: Cas A PI: Dr. CXC Calibration Title: AO5A Observations of the Standard Candles Cas A and G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 350.853234 58.840710 252.738632 26.802048 9.429826 350.848625 58.840088 294.602264 31.502550 9.351696 350.866341 58.811756 120.583336 13.250333 9.100400 350.870129 58.828739 128.833328 18.493849 6.966280 350.857408 58.834284 117.625000 18.483480 6.363791 350.837134 58.841218 150.250000 25.423018 5.909999 350.886397 58.796751 140.583328 25.342525 5.547329 350.891498 58.832241 86.443184 16.541334 5.225890 350.899126 58.834408 144.977280 27.839329 5.207643 350.896561 58.834411 141.488632 28.402216 4.981606