Summary Page Created:Thu June 1, 2006 13:59 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590363

Instrument: ACIS Obs ID: 5165 Source: G21.5-09[I3,-120,-2.5,2.5,0] PI: Dr. CXC Calibration Title: AO5A Observations of the Standard Candles Cas A and G21.5-09

acisf05165N004 full img2.fits acisf05165N004 cntr img2.fits

Summary Page Created:Thu June 1, 2006 13:59 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590363

Instrument: ACIS Obs ID: 5165 Source: G21.5-09[I3,-120,-2.5,2.5,0] PI: Dr. CXC Calibration Title: AO5A Observations of the Standard Candles Cas A and G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-01T17:24:24 Date and time of file creation DATE-OBS 2004-03-26T11:13:29 Observation start date DATE-END 2004-03-26T14:16:45 Observation end date RA PNT 278.43137307289 Pointing RA DEC PNT -10.52046728073 Pointing Dec ROLL PNT 93.094416551286 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-01T17:56:29 Date and time of file creation DATE-OBS 2004-03-26T11:13:29 Observation start date DATE-END 2004-03-26T14:16:45 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-012367 Detector GRATING NONE Grating OBJECT G21.5-09[I3,-120,-2.5,2.5,0] Source name TITLE AO5A Observations of the Standard Candles Cas A and G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5165 Observation id SEQ NUM 590363 Sequence number RA NOM 278.43137307289 Nominal RA DEC NOM -10.52046728073 Nominal Dec ROLL NOM 93.094416551286 Nominal Roll

Summary Page Created:Thu June 1, 2006 13:59 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590363

Instrument: ACIS Obs ID: 5165 Source: G21.5-09[I3,-120,-2.5,2.5,0] PI: Dr. CXC Calibration Title: AO5A Observations of the Standard Candles Cas A and G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.389706 -10.568832 1263.750000 54.807743 23.057873 278.367854 -10.402555 107.625000 12.605289 8.538083 278.365773 -10.590170 79.318184 10.564924 7.507690 278.127323 -10.639142 159.128983 27.437031 5.799789 278.119201 -10.516102 117.448502 21.410110 5.485656 278.500492 -10.541723 33.714287 7.591296 4.441177 278.332685 -10.565177 31.897499 7.275130 4.384458 278.124981 -10.625041 123.305649 29.546873 4.173222 278.155836 -10.515213 78.727272 20.405653 3.858111 278.144367 -10.638164 107.368774 28.154652 3.813536