Summary Page Created:Mon May 29, 2006 08:59 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590364

Instrument: ACIS Obs ID: 5166 Source: G21.5-09[S3,-120,-1.0,0,0] PI: Dr. CXC Calibration Title: AO5A Observations of the Standard Candles Cas A and G21.5-09

acisf05166N002 full img2.fits acisf05166N002 cntr img2.fits

Summary Page Created:Mon May 29, 2006 08:59 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590364

Instrument: ACIS Obs ID: 5166 Source: G21.5-09[S3,-120,-1.0,0,0] PI: Dr. CXC Calibration Title: AO5A Observations of the Standard Candles Cas A and G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-29T12:30:19 Date and time of file creation DATE-OBS 2004-03-14T22:13:44 Observation start date DATE-END 2004-03-15T01:42:45 Observation end date RA PNT 278.39113174785 Pointing RA DEC PNT -10.547822328292 Pointing Dec ROLL PNT 90.443923817242 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-05-29T12:58:38 Date and time of file creation DATE-OBS 2004-03-14T22:13:44 Observation start date DATE-END 2004-03-15T01:42:45 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-235678 Detector GRATING NONE Grating OBJECT G21.5-09[S3,-120,-1.0,0,0] Source name TITLE AO5A Observations of the Standard Candles Cas A and G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5166 Observation id SEQ NUM 590364 Sequence number RA NOM 278.39113174785 Nominal RA DEC NOM -10.547822328292 Nominal Dec ROLL NOM 90.443923817242 Nominal Roll

Summary Page Created:Mon May 29, 2006 08:59 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590364

Instrument: ACIS Obs ID: 5166 Source: G21.5-09[S3,-120,-1.0,0,0] PI: Dr. CXC Calibration Title: AO5A Observations of the Standard Candles Cas A and G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.389984 -10.568862 883.142883 57.223190 15.433304 278.367857 -10.402906 170.704544 16.507742 10.340878 278.450177 -10.246411 239.458466 31.458998 7.611764 278.365756 -10.590094 66.285713 10.697776 6.196215 278.325794 -10.246662 158.744186 28.356848 5.598090 278.454369 -10.282063 130.977280 24.414923 5.364640 278.325148 -10.253207 134.888397 27.521648 4.901174 278.451208 -10.253172 147.825897 30.201473 4.894659 278.417955 -10.242213 129.833893 28.857580 4.499126 278.337636 -10.242513 116.661133 27.047756 4.313154