Summary Page Created:Fri November 23, 2007 18:45 EST page: 1 of 3

Chandra X-ray Center Seq Num: 590365

Instrument: HRC Obs ID: 5167 Source: G21.5-09 PI: Dr. CXC Calibration Title: AO5A Observations of the Standard Candles Cas A and G21.5-09

hrcf05167N003 full img2.fits hrcf05167N003 cntr img2.fits

Summary Page Created:Fri November 23, 2007 18:45 EST page: 2 of 3

Chandra X-ray Center Seq Num: 590365

Instrument: HRC Obs ID: 5167 Source: G21.5-09 PI: Dr. CXC Calibration Title: AO5A Observations of the Standard Candles Cas A and G21.5-09

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-23T23:18:20 Date and time of file creation DATE-OBS 2004-03-25T18:43:32 Observation start date DATE-END 2004-03-26T00:21:18 Observation end date RA PNT 278.39104628987 Pointing RA DEC PNT -10.564690117592 Pointing Dec ROLL PNT 92.60476160639 Pointing Roll RA TARG 278.389583 Observer’s specified target RA DEC TARG -10.568528 Observer’s specified target Dec DEGAP hrciD1999-07- 22gaplookupN0003.fits

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.11.2 Processing system revision DATE 2007-11-23T23:43:15 Date and time of file creation DATE-OBS 2004-03-25T18:43:32 Observation start date DATE-END 2004-03-26T00:21:18 Observation end date INSTRUME HRC Instrument DETNAM HRC-I Detector GRATING NONE Grating OBJECT G21.5-09 Source name TITLE AO5A Observations of the Standard Candles Cas A and G21.5-09

Propo

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5167 Observation id SEQ NUM 590365 Sequence number RA NOM 278.39104628987 Nominal RA DEC NOM -10.564690117592 Nominal Dec ROLL NOM 92.60476160639 Nominal Roll

Summary Page Created:Fri November 23, 2007 18:45 EST page: 3 of 3

Chandra X-ray Center Seq Num: 590365

Instrument: HRC Obs ID: 5167 Source: G21.5-09 PI: Dr. CXC Calibration Title: AO5A Observations of the Standard Candles Cas A and G21.5-09

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 278.365751 -10.590128 76.142860 10.675979 7.132166 278.390039 -10.568873 154.166672 27.076817 5.693678 278.711791 -10.523181 232.817276 43.772968 5.318746 278.710722 -10.598228 186.993362 40.259632 4.644686 278.468877 -10.853932 177.157150 39.295948 4.508280 278.370952 -10.886797 176.993362 40.130886 4.410402 278.633199 -10.450572 134.621704 31.061634 4.334019 278.190654 -10.420146 113.916664 26.539572 4.292333 278.070931 -10.618789 154.086380 36.194443 4.257183 278.682232 -10.494855 154.166672 36.355690 4.240510