Summary Page Created:Thu June 22, 2006 03:52 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590367

Instrument: ACIS Obs ID: 5251 Source: E0102-72[S3,-120,-1,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

acisf05251N002 full img2.fits acisf05251N002 cntr img2.fits

Summary Page Created:Thu June 22, 2006 03:52 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590367

Instrument: ACIS Obs ID: 5251 Source: E0102-72[S3,-120,-1,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-22T07:38:55 Date and time of file creation DATE-OBS 2003-12-24T20:45:35 Observation start date DATE-END 2003-12-24T23:17:38 Observation end date RA PNT 16.064562747699 Pointing RA DEC PNT -72.083454528141 Pointing Dec ROLL PNT 290.04022240406 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.4460144 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-22T07:51:44 Date and time of file creation DATE-OBS 2003-12-24T20:45:35 Observation start date DATE-END 2003-12-24T23:17:38 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S3,-120,-1,0,0] Source name TITLE AO5A ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5251 Observation id SEQ NUM 590367 Sequence number RA NOM 16.064562747699 Nominal RA DEC NOM -72.083454528141 Nominal Dec ROLL NOM 290.04022240406 Nominal Roll

Summary Page Created:Thu June 22, 2006 03:52 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590367

Instrument: ACIS Obs ID: 5251 Source: E0102-72[S3,-120,-1,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.015095 -72.034911 798.693176 52.490070 15.216082 16.019143 -72.032567 759.431824 55.853642 13.596818 16.018902 -72.033354 779.431824 57.441616 13.569114 16.259763 -72.384117 660.498352 54.759315 12.061845 15.996671 -72.031311 597.522705 50.900608 11.739010 16.003281 -72.034603 681.102295 59.629539 11.422230 15.999348 -72.028395 555.750000 50.979565 10.901427 16.003145 -72.028040 514.545471 52.293915 9.839490 16.020336 -72.031327 463.136353 48.974049 9.456771 16.008561 -72.031796 342.170441 36.510765 9.371769