Summary Page Created:Thu June 22, 2006 03:58 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 590368

Instrument: ACIS Obs ID: 5252 Source: E0102-72[S3,-120,-1,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

acisf05252N002 full img2.fits acisf05252N002 cntr img2.fits

Summary Page Created:Thu June 22, 2006 03:58 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 590368

Instrument: ACIS Obs ID: 5252 Source: E0102-72[S3,-120,-1,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-22T07:38:49 Date and time of file creation DATE-OBS 2003-12-24T23:17:38 Observation start date DATE-END 2003-12-25T01:39:05 Observation end date RA PNT 16.100730603138 Pointing RA DEC PNT -72.11480566364 Pointing Dec ROLL PNT 289.9519658212 Pointing Roll RA TARG 16.01 Observer’s specified target RA DEC TARG -72.032028 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.8 ASCDS version number DATE 2006-06-22T07:56:58 Date and time of file creation DATE-OBS 2003-12-24T23:17:38 Observation start date DATE-END 2003-12-25T01:39:05 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-456789 Detector GRATING NONE Grating OBJECT E0102-72[S3,-120,-1,0,0] Source name TITLE AO5A ACIS-S Calibration Observations of E0102-72

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5252 Observation id SEQ NUM 590368 Sequence number RA NOM 16.100730603138 Nominal RA DEC NOM -72.11480566364 Nominal Dec ROLL NOM 289.9519658212 Nominal Roll

Summary Page Created:Thu June 22, 2006 03:58 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 590368

Instrument: ACIS Obs ID: 5252 Source: E0102-72[S3,-120,-1,0,0] PI: Dr. CXC Calibration Title: AO5A ACIS-S Calibration Observations of E0102-72

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 16.018747 -72.032857 2063.000000 84.334351 24.462156 16.002622 -72.034394 2039.988647 91.642273 22.260345 16.002458 -72.027961 1575.159058 81.367210 19.358648 15.997331 -72.031173 1506.397705 79.986862 18.833063 16.014277 -72.034801 1347.833374 74.149254 18.177301 16.010228 -72.027124 1229.784058 77.539841 15.860028 16.015669 -72.027899 1029.534058 74.374161 13.842630 16.005109 -72.035194 1001.541687 73.982018 13.537637 16.263928 -72.382498 504.041656 54.354984 9.273146 15.905944 -72.025956 111.082756 12.946153 8.580369