Summary Page Created:Tue June 6, 2006 15:55 EDT page: 1 of 3

Chandra X-ray Center Seq Num: 890027

Instrument: ACIS Obs ID: 5287 Source: A1795 PI: Dr. CXC Calibration Title: Mapping the Depth of the Contaminant on the ACIS Filters with Abell 11795

acisf05287N002 full img2.fits acisf05287N002 cntr img2.fits

Summary Page Created:Tue June 6, 2006 15:55 EDT page: 2 of 3

Chandra X-ray Center Seq Num: 890027

Instrument: ACIS Obs ID: 5287 Source: A1795 PI: Dr. CXC Calibration Title: Mapping the Depth of the Contaminant on the ACIS Filters with Abell 11795

Level 1 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-06T19:13:51 Date and time of file creation DATE-OBS 2004-01-14T16:16:01 Observation start date DATE-END 2004-01-14T20:36:40 Observation end date RA PNT 207.22920970828 Pointing RA DEC PNT 26.609716419413 Pointing Dec ROLL PNT 70.236180364976 Pointing Roll RA TARG 207.219583 Observer’s specified target RA DEC TARG 26.590833 Observer’s specified target Dec DATAMODE VFAINT Data mode READMODE TIMED Read mode FP TEMP 153.60722351 Focal Plane Temperature [K] FSW VERS 30 ACIS flight software version number

Level 2 Observational Parameters Parameter Value Description ASCDSVER 7.6.7.2 ASCDS version number DATE 2006-06-06T19:54:14 Date and time of file creation DATE-OBS 2004-01-14T16:16:01 Observation start date DATE-END 2004-01-14T20:36:40 Observation end date INSTRUME ACIS Instrument DETNAM ACIS-23567 Detector GRATING NONE Grating OBJECT A1795 Source name TITLE Mapping the Depth of the Contaminant on the ACIS Filters with Abell 11795

Proposal title

OBSERVER Dr. CXC Calibration Principal investigator OBS ID 5287 Observation id SEQ NUM 890027 Sequence number RA NOM 207.22920970828 Nominal RA DEC NOM 26.609716419413 Nominal Dec ROLL NOM 70.236180364976 Nominal Roll

Summary Page Created:Tue June 6, 2006 15:55 EDT page: 3 of 3

Chandra X-ray Center Seq Num: 890027

Instrument: ACIS Obs ID: 5287 Source: A1795 PI: Dr. CXC Calibration Title: Mapping the Depth of the Contaminant on the ACIS Filters with Abell 11795

Full Field with Sources

List of the Brighest Sources in the Field RA[deg] DEC[deg] NET COUNTS[count] NET COUNTS ERR[count] SNR 207.145611 26.519633 2601.503418 58.906441 44.163311 207.410033 26.876786 244.827240 30.371084 8.061195 207.280911 26.916300 222.179398 33.210693 6.689996 207.259349 26.784964 100.045456 16.691366 5.993845 207.316134 26.839146 178.958328 30.523647 5.862941 207.324154 26.903145 196.601334 35.312130 5.567530 207.356234 26.892102 184.562500 34.942680 5.281864 207.276686 26.910334 175.427673 33.608032 5.219814 207.189352 26.590271 58.571430 11.294973 5.185619 207.331434 26.726277 50.431820 10.453816 4.824249